X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/eafc087e69e52add5952190bfd5bcbbf931ad12b..dc9e1e56917ad9b448bd0087a2d1ae3c632c4db1:/docs/latex/wx/process.tex?ds=inline

diff --git a/docs/latex/wx/process.tex b/docs/latex/wx/process.tex
index 160d34e1b2..ee84b0e404 100644
--- a/docs/latex/wx/process.tex
+++ b/docs/latex/wx/process.tex
@@ -15,7 +15,8 @@ isn't overriden.
 \func{}{wxProcess}{\param{wxEvtHandler *}{ parent = NULL}, \param{int}{ id = -1}}
 
 Constructs a process object. {\it id} is only used in the case you want to
-use wxWindows events. 
+use wxWindows events. It identifies this object, or another window that will
+receive the event.
 
 \wxheading{Parameters}
 
@@ -37,3 +38,4 @@ It is called when the process with the pid {\it pid} finishes.
 It raises a wxWindows event when it isn't overriden.
 
 \docparam{pid}{The pid of the process which ends.}
+
