X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/eafc087e69e52add5952190bfd5bcbbf931ad12b..c1b7dab08b1d02b837baab94a8b37e94a0e9d492:/docs/latex/wx/process.tex

diff --git a/docs/latex/wx/process.tex b/docs/latex/wx/process.tex
index 160d34e1b2..b09bb386ef 100644
--- a/docs/latex/wx/process.tex
+++ b/docs/latex/wx/process.tex
@@ -8,6 +8,10 @@ isn't overriden.
 
 \helpref{wxEvtHandler}{wxevthandler}
 
+\wxheading{Include files}
+
+<wx/process.h>
+
 \latexignore{\rtfignore{\wxheading{Members}}}
 
 \membersection{wxProcess::wxProcess}\label{wxprocessconstr}
@@ -15,7 +19,8 @@ isn't overriden.
 \func{}{wxProcess}{\param{wxEvtHandler *}{ parent = NULL}, \param{int}{ id = -1}}
 
 Constructs a process object. {\it id} is only used in the case you want to
-use wxWindows events. 
+use wxWindows events. It identifies this object, or another window that will
+receive the event.
 
 \wxheading{Parameters}
 
@@ -37,3 +42,4 @@ It is called when the process with the pid {\it pid} finishes.
 It raises a wxWindows event when it isn't overriden.
 
 \docparam{pid}{The pid of the process which ends.}
+
