X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/eaaa6a06a25774c18d10bb8182cc1934ed0ed9aa..dc9e1e56917ad9b448bd0087a2d1ae3c632c4db1:/docs/latex/wx/statusbr.tex?ds=sidebyside

diff --git a/docs/latex/wx/statusbr.tex b/docs/latex/wx/statusbr.tex
index 8e604b2367..965e30bc28 100644
--- a/docs/latex/wx/statusbr.tex
+++ b/docs/latex/wx/statusbr.tex
@@ -10,7 +10,11 @@ be variable length according to the size of the window.
 
 \wxheading{Window styles}
 
-There are no special styles for this window.
+\twocolwidtha{5cm}
+\begin{twocollist}\itemsep=0pt
+\twocolitem{\windowstyle{wxSB\_SIZEGRIP}}{On Windows 95, displays a gripper at right-hand side of
+the status bar.}
+\end{twocollist}
 
 See also \helpref{window styles overview}{windowstyles}.
 
