X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/eaaa6a06a25774c18d10bb8182cc1934ed0ed9aa..d2d93fdde48ef1dcbda52bad88fd39b7bd3a5458:/docs/latex/wx/statusbr.tex?ds=sidebyside

diff --git a/docs/latex/wx/statusbr.tex b/docs/latex/wx/statusbr.tex
index 8e604b2367..9f134c6ac7 100644
--- a/docs/latex/wx/statusbr.tex
+++ b/docs/latex/wx/statusbr.tex
@@ -8,9 +8,23 @@ be variable length according to the size of the window.
 \helpref{wxEvtHandler}{wxevthandler}\\
 \helpref{wxObject}{wxobject}
 
+\wxheading{Derived from}
+
+\helpref{wxWindow}{wxwindow}\\
+\helpref{wxEvtHandler}{wxevthandler}\\
+\helpref{wxObject}{wxobject}
+
+\wxheading{Include files}
+
+<wx/statusbr.h>
+
 \wxheading{Window styles}
 
-There are no special styles for this window.
+\twocolwidtha{5cm}
+\begin{twocollist}\itemsep=0pt
+\twocolitem{\windowstyle{wxSB\_SIZEGRIP}}{On Windows 95, displays a gripper at right-hand side of
+the status bar.}
+\end{twocollist}
 
 See also \helpref{window styles overview}{windowstyles}.
 
@@ -21,7 +35,7 @@ from an {\bf OnSize} event handler.
 
 \wxheading{See also}
 
-\helpref{wxFrame}{wxframe}
+\helpref{wxFrame}{wxframe}, \helpref{Status bar sample}{samplestatbar}
 
 \latexignore{\rtfignore{\wxheading{Members}}}
 
@@ -198,6 +212,14 @@ Sets the number of fields, and optionally the field widths.
 in pixels. A value of -1 indicates that the field is variable width; at least one
 field must be -1.}
 
+\membersection{wxStatusBar::SetMinHeight}\label{wxstatusbarsetminheight}
+
+\func{void}{SetMinHeight}{\param{int}{ height}}
+
+Sets the minimal possible hight for the status bar. The real height may be
+bigger than the height specified here depending on the size of the font used by
+the status bar.
+
 \membersection{wxStatusBar::SetStatusText}\label{wxstatusbarsetstatustext}
 
 \func{virtual void}{SetStatusText}{\param{const wxString\& }{text}, \param{int}{ i = 0}}
@@ -231,11 +253,14 @@ field must be -1. You should delete this array after calling {\bf SetStatusWidth
 \wxheading{Remarks}
 
 The widths of the variable fields are calculated from the total width of all fields,
-minus the sum of widths of the non-variable fields, divided by the number of 
+minus the sum of widths of the non-variable fields, divided by the number of
 variable fields.
 
 \wxheading{See also}
 
 \helpref{wxStatusBar::SetFieldsCount}{wxstatusbarsetfieldscount}, \helpref{wxFrame::SetStatusWidths}{wxframesetstatuswidths}
 
+\pythonnote{Only a single parameter is required, a Python list of
+integers.}
+
 
