X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/eaaa6a06a25774c18d10bb8182cc1934ed0ed9aa..b412f9be504e07559a98ae234f30bb1bd0b2aa1f:/docs/latex/wx/button.tex

diff --git a/docs/latex/wx/button.tex b/docs/latex/wx/button.tex
index 1bdd34457f..4b92248274 100644
--- a/docs/latex/wx/button.tex
+++ b/docs/latex/wx/button.tex
@@ -18,6 +18,14 @@ There are no special styles for wxButton.
 
 See also \helpref{window styles overview}{windowstyles}.
 
+\wxheading{Event handling}
+
+\twocolwidtha{7cm}%
+\begin{twocollist}\itemsep=0pt
+\twocolitem{{\bf EVT\_BUTTON(id, func)}}{Process a wxEVT\_COMMAND\_BUTTON\_CLICKED event,
+when the button is clicked.}
+\end{twocollist}
+
 \wxheading{See also}
 
 \helpref{wxBitmapButton}{wxbitmapbutton}
@@ -99,7 +107,7 @@ box.
 Under Windows, only dialog box buttons respond to this function.  As
 normal under Windows and Motif, pressing return causes the default button to
 be depressed when the return key is pressed. See also \helpref{wxWindow::SetFocus}{wxwindowsetfocus}\rtfsp
-which sets the keyboard focus for windows and text panel items, \helpref{wxWindow::OnDefaultAction}{wxwindowondefaultaction}\rtfsp
+which sets the keyboard focus for windows and text panel items,\rtfsp
 and \helpref{wxWindow::GetDefaultItem}{wxwindowgetdefaultitem}.
 
 Note that under Motif, calling this function immediately after
