X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/eaaa6a06a25774c18d10bb8182cc1934ed0ed9aa..69b5cec2b0993ce4cd56f2e50ab94e5ebd20069c:/docs/latex/wx/gauge.tex?ds=inline

diff --git a/docs/latex/wx/gauge.tex b/docs/latex/wx/gauge.tex
index e64d5e3208..b3c01d4745 100644
--- a/docs/latex/wx/gauge.tex
+++ b/docs/latex/wx/gauge.tex
@@ -7,9 +7,13 @@ There are no user commands for the gauge.
 
 \helpref{wxControl}{wxcontrol}\\
 \helpref{wxWindow}{wxwindow}\\
-\helpref{wxEvtHandler}{wxEvtHandler}\\
+\helpref{wxEvtHandler}{wxevthandler}\\
 \helpref{wxObject}{wxobject}
 
+\wxheading{Include files}
+
+<wx/gauge.h>
+
 \wxheading{Window styles}
 
 \twocolwidtha{5cm}
@@ -17,10 +21,15 @@ There are no user commands for the gauge.
 \twocolitem{\windowstyle{wxGA\_HORIZONTAL}}{Creates a horizontal gauge.}
 \twocolitem{\windowstyle{wxGA\_VERTICAL}}{Creates a vertical gauge.}
 \twocolitem{\windowstyle{wxGA\_PROGRESSBAR}}{Under Windows 95, creates a horizontal progress bar.}
+\twocolitem{\windowstyle{wxGA\_SMOOTH}}{Under Windows 95, creates smooth progress bar with one pixel wide update step.}
 \end{twocollist}
 
 See also \helpref{window styles overview}{windowstyles}.
 
+\wxheading{Event handling}
+
+wxGauge is read-only so generates no events.
+
 \wxheading{See also}
 
 \helpref{wxSlider}{wxslider}, \helpref{wxScrollBar}{wxscrollbar}
