X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/eaaa6a06a25774c18d10bb8182cc1934ed0ed9aa..678b92a94a3a4897c2546171ce42ca54b25c1e63:/docs/latex/wx/conditn.tex

diff --git a/docs/latex/wx/conditn.tex b/docs/latex/wx/conditn.tex
index f6b77506d0..47cc257e81 100644
--- a/docs/latex/wx/conditn.tex
+++ b/docs/latex/wx/conditn.tex
@@ -1,11 +1,15 @@
 \section{\class{wxCondition}}\label{wxcondition}
 
-TODO
+Condition class for code protection in multithreaded applications.
 
 \wxheading{Derived from}
 
 None.
 
+\wxheading{Include files}
+
+<wx/thread.h>
+
 \wxheading{See also}
 
 \helpref{wxThread}{wxthread}, \helpref{wxMutex}{wxmutex}
@@ -58,4 +62,3 @@ Waits until a signal is raised or the timeout has elapsed.
 
 The second form returns if the signal was raised, or FALSE if there was a timeout.
 
-
