X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/eaaa6a06a25774c18d10bb8182cc1934ed0ed9aa..671bf007ddc1823506bdec7013002bd56e744256:/docs/latex/wx/print.tex

diff --git a/docs/latex/wx/print.tex b/docs/latex/wx/print.tex
index fbc7e61755..cc02e3158d 100644
--- a/docs/latex/wx/print.tex
+++ b/docs/latex/wx/print.tex
@@ -1,158 +1,356 @@
 \section{\class{wxPrintData}}\label{wxprintdata}
 
-This class holds a variety of information related to print dialogs.
+This class holds a variety of information related to printers and
+printer device contexts. This class is used to create a wxPrinterDC
+and a wxPostScriptDC. It is also used as a data member of wxPrintDialogData
+and wxPageSetupDialogData, as part of the mechanism for transferring data
+between the print dialogs and the application.
 
 \wxheading{Derived from}
 
 \helpref{wxObject}{wxobject}
 
+\wxheading{Include files}
+
+<wx/cmndata.h>
+
 \wxheading{See also}
 
-\helpref{wxPrintDialog}{wxprintdialog}, \helpref{wxPrintDialog Overview}{wxprintdialogoverview}
+\helpref{wxPrintDialog}{wxprintdialog}, 
+\helpref{wxPageSetupDialog}{wxpagesetupdialog}, 
+\helpref{wxPrintDialogData}{wxprintdialogdata}, 
+\helpref{wxPageSetupDialogData}{wxpagesetupdialogdata}, 
+\helpref{wxPrintDialog Overview}{wxprintdialogoverview}, 
+\helpref{wxPrinterDC}{wxprinterdc}, 
+\helpref{wxPostScriptDC}{wxpostscriptdc}
+
+\wxheading{Remarks}
+
+The following functions are specific to PostScript printing
+and have not yet been documented:
+
+\begin{verbatim}
+const wxString& GetPrinterCommand() const ;
+const wxString& GetPrinterOptions() const ;
+const wxString& GetPreviewCommand() const ;
+const wxString& GetFilename() const ;
+const wxString& GetFontMetricPath() const ;
+double GetPrinterScaleX() const ;
+double GetPrinterScaleY() const ;
+long GetPrinterTranslateX() const ;
+long GetPrinterTranslateY() const ;
+// wxPRINT_MODE_PREVIEW, wxPRINT_MODE_FILE, wxPRINT_MODE_PRINTER
+wxPrintMode GetPrintMode() const ;
+
+void SetPrinterCommand(const wxString& command) ;
+void SetPrinterOptions(const wxString& options) ;
+void SetPreviewCommand(const wxString& command) ;
+void SetFilename(const wxString& filename) ;
+void SetFontMetricPath(const wxString& path) ;
+void SetPrinterScaleX(double x) ;
+void SetPrinterScaleY(double y) ;
+void SetPrinterScaling(double x, double y) ;
+void SetPrinterTranslateX(long x) ;
+void SetPrinterTranslateY(long y) ;
+void SetPrinterTranslation(long x, long y) ;
+void SetPrintMode(wxPrintMode printMode) ;
+\end{verbatim}
 
 \latexignore{\rtfignore{\wxheading{Members}}}
 
-\membersection{wxPrintData::wxPrintData}
+
+\membersection{wxPrintData::wxPrintData}\label{wxprintdatactor}
 
 \func{}{wxPrintData}{\void}
 
-Constructor.
+Default constructor.
+
+\func{}{wxPrintData}{\param{const wxPrintData\&}{ data}}
+
+Copy constructor.
 
-\membersection{wxPrintData::\destruct{wxPrintData}}
+
+\membersection{wxPrintData::\destruct{wxPrintData}}\label{wxprintdatadtor}
 
 \func{}{\destruct{wxPrintData}}{\void}
 
 Destructor.
 
-\membersection{wxPrintData::EnableHelp}\label{wxprintdataenablehelp}
 
-\func{void}{EnableHelp}{\param{bool }{flag}}
+\membersection{wxPrintData::GetCollate}\label{wxprintdatagetcollate}
 
-Enables or disables the `Help' button.
+\constfunc{bool}{GetCollate}{\void}
 
-\membersection{wxPrintData::EnablePageNumbers}\label{wxprintdataenablepagenumbers}
+Returns true if collation is on.
 
-\func{void}{EnablePageNumbers}{\param{bool }{flag}}
 
-Enables or disables the `Page numbers' controls.
+\membersection{wxPrintData::GetBin}\label{wxprintdatagetbin}
 
-\membersection{wxPrintData::EnablePrintToFile}\label{wxprintdataenableprinttofile}
+\constfunc{wxPrintBin}{GetBin}{\void}
 
-\func{void}{EnablePrintToFile}{\param{bool }{flag}}
+Returns the current bin (papersource). By default, the system is left to select
+the bin (\texttt{wxPRINTBIN\_DEFAULT} is returned).
 
-Enables or disables the `Print to file' checkbox.
+See \helpref{SetBin()}{wxprintdatasetbin} for the full list of bin values.
 
-\membersection{wxPrintData::EnableSelection}\label{wxprintdataenableselection}
 
-\func{void}{EnableSelection}{\param{bool }{flag}}
+\membersection{wxPrintData::GetColour}\label{wxprintdatagetcolour}
 
-Enables or disables the `Selection' radio button.
+\constfunc{bool}{GetColour}{\void}
 
-\membersection{wxPrintData::GetAllPages}\label{wxprintdatagetallpages}
+Returns true if colour printing is on.
 
-\func{bool}{GetAllPages}{\void}
 
-Returns TRUE if the user requested that all pages be printed.
+\membersection{wxPrintData::GetDuplex}\label{wxprintdatagetduplex}
 
-\membersection{wxPrintData::GetCollate}\label{wxprintdatagetcollate}
+\constfunc{wxDuplexMode}{GetDuplex}{\void}
 
-\func{bool}{GetCollate}{\void}
+Returns the duplex mode. One of wxDUPLEX\_SIMPLEX, wxDUPLEX\_HORIZONTAL, wxDUPLEX\_VERTICAL.
 
-Returns TRUE if the user requested that the document(s) be collated.
 
-\membersection{wxPrintData::GetFromPage}\label{wxprintdatagetfrompage}
+\membersection{wxPrintData::GetNoCopies}\label{wxprintdatagetnocopies}
 
-\func{int}{GetFromPage}{\void}
+\constfunc{int}{GetNoCopies}{\void}
 
-Returns the {\it from} page number, as entered by the user.
+Returns the number of copies requested by the user.
 
-\membersection{wxPrintData::GetMaxPage}\label{wxprintdatagetmaxpage}
 
-\func{int}{GetMaxPage}{\void}
+\membersection{wxPrintData::GetOrientation}\label{wxprintdatagetorientation}
 
-Returns the {\it maximum} page number.
+\constfunc{int}{GetOrientation}{\void}
 
-\membersection{wxPrintData::GetMinPage}\label{wxprintdatagetminpage}
+Gets the orientation. This can be wxLANDSCAPE or wxPORTRAIT.
 
-\func{int}{GetMinPage}{\void}
 
-Returns the {\it minimum} page number.
+\membersection{wxPrintData::GetPaperId}\label{wxprintdatagetpaperid}
 
-\membersection{wxPrintData::GetNoCopies}\label{wxprintdatagetnocopies}
+\constfunc{wxPaperSize}{GetPaperId}{\void}
 
-\func{int}{GetNoCopies}{\void}
+Returns the paper size id. For more information, see \helpref{wxPrintData::SetPaperId}{wxprintdatasetpaperid}.
 
-Returns the number of copies requested by the user.
 
-\membersection{wxPrintData::GetOrientation}\label{wxprintdatagetorientation}
+\membersection{wxPrintData::GetPrinterName}\label{wxprintdatagetprintername}
 
-\func{int}{GetOrientation}{\void}
+\constfunc{const wxString\&}{GetPrinterName}{\void}
 
-Gets the orientation. This can be wxLANDSCAPE or wxPORTRAIT.
+Returns the printer name. If the printer name is the empty string, it indicates that the default
+printer should be used.
 
-\membersection{wxPrintData::GetToPage}\label{wxprintdatagettopage}
 
-\func{int}{GetToPage}{\void}
+\membersection{wxPrintData::GetQuality}\label{wxprintdatagetquality}
 
-Returns the {\it to} page number, as entered by the user.
+\constfunc{wxPrintQuality}{GetQuality}{\void}
 
-\membersection{wxPrintData::SetCollate}\label{wxprintdatasetcollate}
+Returns the current print quality. This can be a positive integer, denoting the number of dots per inch, or
+one of the following identifiers:
 
-\func{void}{SetCollate}{\param{bool }{flag}}
+\begin{verbatim}
+wxPRINT_QUALITY_HIGH
+wxPRINT_QUALITY_MEDIUM
+wxPRINT_QUALITY_LOW
+wxPRINT_QUALITY_DRAFT
+\end{verbatim}
 
-Sets the 'Collate' checkbox to TRUE or FALSE.
+On input you should pass one of these identifiers, but on return you may get back a positive integer
+indicating the current resolution setting.
 
-\membersection{wxPrintData::SetFromPage}\label{wxprintdatasetfrompage}
 
-\func{void}{SetFromPage}{\param{int }{page}}
+\membersection{wxPrintData::Ok}\label{wxprintdataok}
 
-Sets the {\it from} page number.
+\constfunc{bool}{Ok}{\void}
 
-\membersection{wxPrintData::SetMaxPage}\label{wxprintdatasetmaxpage}
+Returns true if the print data is valid for using in print dialogs.
+This can return false on Windows if the current printer is not set, for example.
+On all other platforms, it returns true.
 
-\func{void}{SetMaxPage}{\param{int }{page}}
 
-Sets the {\it maximum} page number.
+\membersection{wxPrintData::SetBin}\label{wxprintdatasetbin}
 
-\membersection{wxPrintData::SetMinPage}\label{wxprintdatasetminpage}
+\func{void}{SetBin}{\param{wxPrintBin }{flag}}
 
-\func{void}{SetMinPage}{\param{int }{page}}
+Sets the current bin. Possible values are:
 
-Sets the {\it minimum} page number.
+\small{
+\begin{verbatim}
+enum wxPrintBin
+{
+    wxPRINTBIN_DEFAULT,
 
-\membersection{wxPrintData::SetOrientation}\label{wxprintdatasetorientation}
+    wxPRINTBIN_ONLYONE,
+    wxPRINTBIN_LOWER,
+    wxPRINTBIN_MIDDLE,
+    wxPRINTBIN_MANUAL,
+    wxPRINTBIN_ENVELOPE,
+    wxPRINTBIN_ENVMANUAL,
+    wxPRINTBIN_AUTO,
+    wxPRINTBIN_TRACTOR,
+    wxPRINTBIN_SMALLFMT,
+    wxPRINTBIN_LARGEFMT,
+    wxPRINTBIN_LARGECAPACITY,
+    wxPRINTBIN_CASSETTE,
+    wxPRINTBIN_FORMSOURCE,
 
-\func{void}{SetOrientation}{\param{int }{orientation}}
+    wxPRINTBIN_USER,
+};
+\end{verbatim}
+}
 
-Sets the orientation. This can be wxLANDSCAPE or wxPORTRAIT.
 
-\membersection{wxPrintData::SetNoCopies}\label{wxprintdatasetnocopies}
+\membersection{wxPrintData::SetCollate}\label{wxprintdatasetcollate}
 
-\func{void}{SetNoCopies}{\param{int }{n}}
+\func{void}{SetCollate}{\param{bool }{flag}}
 
-Sets the default number of copies to be printed out.
+Sets collation to on or off.
 
-\membersection{wxPrintData::SetPrintToFile}\label{wxprintdatasetprinttofile}
 
-\func{void}{SetPrintToFile}{\param{bool }{flag}}
+\membersection{wxPrintData::SetColour}\label{wxprintdatasetcolour}
 
-Sets the 'Print to file' checkbox to TRUE or FALSE.
+\func{void}{SetColour}{\param{bool }{flag}}
 
-\membersection{wxPrintData::SetSetupDialog}\label{wxprintdatasetsetupdialog}
+Sets colour printing on or off.
 
-\func{void}{SetSetupDialog}{\param{bool }{flag}}
 
-Determines whether the dialog to be shown will be the Print dialog
-(pass FALSE) or Print Setup dialog (pass TRUE).
+\membersection{wxPrintData::SetDuplex}\label{wxprintdatasetduplex}
 
-Note that the setup dialog is obsolete from
-Windows 95, though retained for backward compatibility.
+\func{void}{SetDuplex}{\param{wxDuplexMode}{ mode}}
 
-\membersection{wxPrintData::SetToPage}\label{wxprintdatasettopage}
+Returns the duplex mode. One of wxDUPLEX\_SIMPLEX, wxDUPLEX\_HORIZONTAL, wxDUPLEX\_VERTICAL.
 
-\func{void}{SetToPage}{\param{int }{page}}
 
-Sets the {\it to} page number.
+\membersection{wxPrintData::SetNoCopies}\label{wxprintdatasetnocopies}
+
+\func{void}{SetNoCopies}{\param{int }{n}}
+
+Sets the default number of copies to be printed out.
+
+
+\membersection{wxPrintData::SetOrientation}\label{wxprintdatasetorientation}
+
+\func{void}{SetOrientation}{\param{int }{orientation}}
+
+Sets the orientation. This can be wxLANDSCAPE or wxPORTRAIT.
+
+
+\membersection{wxPrintData::SetPaperId}\label{wxprintdatasetpaperid}
+
+\func{void}{SetPaperId}{\param{wxPaperSize}{ paperId}}
+
+\index{wxPaperSize}Sets the paper id. This indicates the type of paper to be used. For a mapping between
+paper id, paper size and string name, see wxPrintPaperDatabase in {\tt paper.h} (not yet documented).
+
+{\it paperId} can be one of:
+
+{\small
+\begin{verbatim}
+    wxPAPER_NONE,               // Use specific dimensions
+    wxPAPER_LETTER,             // Letter, 8 1/2 by 11 inches
+    wxPAPER_LEGAL,              // Legal, 8 1/2 by 14 inches
+    wxPAPER_A4,                 // A4 Sheet, 210 by 297 millimeters
+    wxPAPER_CSHEET,             // C Sheet, 17 by 22 inches
+    wxPAPER_DSHEET,             // D Sheet, 22 by 34 inches
+    wxPAPER_ESHEET,             // E Sheet, 34 by 44 inches
+    wxPAPER_LETTERSMALL,        // Letter Small, 8 1/2 by 11 inches
+    wxPAPER_TABLOID,            // Tabloid, 11 by 17 inches
+    wxPAPER_LEDGER,             // Ledger, 17 by 11 inches
+    wxPAPER_STATEMENT,          // Statement, 5 1/2 by 8 1/2 inches
+    wxPAPER_EXECUTIVE,          // Executive, 7 1/4 by 10 1/2 inches
+    wxPAPER_A3,                 // A3 sheet, 297 by 420 millimeters
+    wxPAPER_A4SMALL,            // A4 small sheet, 210 by 297 millimeters
+    wxPAPER_A5,                 // A5 sheet, 148 by 210 millimeters
+    wxPAPER_B4,                 // B4 sheet, 250 by 354 millimeters
+    wxPAPER_B5,                 // B5 sheet, 182-by-257-millimeter paper
+    wxPAPER_FOLIO,              // Folio, 8-1/2-by-13-inch paper
+    wxPAPER_QUARTO,             // Quarto, 215-by-275-millimeter paper
+    wxPAPER_10X14,              // 10-by-14-inch sheet
+    wxPAPER_11X17,              // 11-by-17-inch sheet
+    wxPAPER_NOTE,               // Note, 8 1/2 by 11 inches
+    wxPAPER_ENV_9,              // #9 Envelope, 3 7/8 by 8 7/8 inches
+    wxPAPER_ENV_10,             // #10 Envelope, 4 1/8 by 9 1/2 inches
+    wxPAPER_ENV_11,             // #11 Envelope, 4 1/2 by 10 3/8 inches
+    wxPAPER_ENV_12,             // #12 Envelope, 4 3/4 by 11 inches
+    wxPAPER_ENV_14,             // #14 Envelope, 5 by 11 1/2 inches
+    wxPAPER_ENV_DL,             // DL Envelope, 110 by 220 millimeters
+    wxPAPER_ENV_C5,             // C5 Envelope, 162 by 229 millimeters
+    wxPAPER_ENV_C3,             // C3 Envelope, 324 by 458 millimeters
+    wxPAPER_ENV_C4,             // C4 Envelope, 229 by 324 millimeters
+    wxPAPER_ENV_C6,             // C6 Envelope, 114 by 162 millimeters
+    wxPAPER_ENV_C65,            // C65 Envelope, 114 by 229 millimeters
+    wxPAPER_ENV_B4,             // B4 Envelope, 250 by 353 millimeters
+    wxPAPER_ENV_B5,             // B5 Envelope, 176 by 250 millimeters
+    wxPAPER_ENV_B6,             // B6 Envelope, 176 by 125 millimeters
+    wxPAPER_ENV_ITALY,          // Italy Envelope, 110 by 230 millimeters
+    wxPAPER_ENV_MONARCH,        // Monarch Envelope, 3 7/8 by 7 1/2 inches
+    wxPAPER_ENV_PERSONAL,       // 6 3/4 Envelope, 3 5/8 by 6 1/2 inches
+    wxPAPER_FANFOLD_US,         // US Std Fanfold, 14 7/8 by 11 inches
+    wxPAPER_FANFOLD_STD_GERMAN, // German Std Fanfold, 8 1/2 by 12 inches
+    wxPAPER_FANFOLD_LGL_GERMAN, // German Legal Fanfold, 8 1/2 by 13 inches
+
+Windows 95 only:
+    wxPAPER_ISO_B4,             // B4 (ISO) 250 x 353 mm
+    wxPAPER_JAPANESE_POSTCARD,  // Japanese Postcard 100 x 148 mm
+    wxPAPER_9X11,               // 9 x 11 in
+    wxPAPER_10X11,              // 10 x 11 in
+    wxPAPER_15X11,              // 15 x 11 in
+    wxPAPER_ENV_INVITE,         // Envelope Invite 220 x 220 mm
+    wxPAPER_LETTER_EXTRA,       // Letter Extra 9 \275 x 12 in
+    wxPAPER_LEGAL_EXTRA,        // Legal Extra 9 \275 x 15 in
+    wxPAPER_TABLOID_EXTRA,      // Tabloid Extra 11.69 x 18 in
+    wxPAPER_A4_EXTRA,           // A4 Extra 9.27 x 12.69 in
+    wxPAPER_LETTER_TRANSVERSE,  // Letter Transverse 8 \275 x 11 in
+    wxPAPER_A4_TRANSVERSE,      // A4 Transverse 210 x 297 mm
+    wxPAPER_LETTER_EXTRA_TRANSVERSE, // Letter Extra Transverse 9\275 x 12 in
+    wxPAPER_A_PLUS,             // SuperA/SuperA/A4 227 x 356 mm
+    wxPAPER_B_PLUS,             // SuperB/SuperB/A3 305 x 487 mm
+    wxPAPER_LETTER_PLUS,        // Letter Plus 8.5 x 12.69 in
+    wxPAPER_A4_PLUS,            // A4 Plus 210 x 330 mm
+    wxPAPER_A5_TRANSVERSE,      // A5 Transverse 148 x 210 mm
+    wxPAPER_B5_TRANSVERSE,      // B5 (JIS) Transverse 182 x 257 mm
+    wxPAPER_A3_EXTRA,           // A3 Extra 322 x 445 mm
+    wxPAPER_A5_EXTRA,           // A5 Extra 174 x 235 mm
+    wxPAPER_B5_EXTRA,           // B5 (ISO) Extra 201 x 276 mm
+    wxPAPER_A2,                 // A2 420 x 594 mm
+    wxPAPER_A3_TRANSVERSE,      // A3 Transverse 297 x 420 mm
+    wxPAPER_A3_EXTRA_TRANSVERSE // A3 Extra Transverse 322 x 445 mm
+\end{verbatim}
+}
+
+
+\membersection{wxPrintData::SetPrinterName}\label{wxprintdatasetprintername}
+
+\func{void}{SetPrinterName}{\param{const wxString\& }{printerName}}
+
+Sets the printer name. This can be the empty string to indicate that the default
+printer should be used.
+
+
+\membersection{wxPrintData::SetQuality}\label{wxprintdatasetquality}
+
+\func{void}{SetQuality}{\param{wxPrintQuality}{ quality}}
+
+Sets the desired print quality. This can be a positive integer, denoting the number of dots per inch, or
+one of the following identifiers:
+
+\begin{verbatim}
+wxPRINT_QUALITY_HIGH
+wxPRINT_QUALITY_MEDIUM
+wxPRINT_QUALITY_LOW
+wxPRINT_QUALITY_DRAFT
+\end{verbatim}
+
+On input you should pass one of these identifiers, but on return you may get back a positive integer
+indicating the current resolution setting.
+
+
+\membersection{wxPrintData::operator $=$}\label{wxprintdataassign}
+
+\func{void}{operator $=$}{\param{const wxPrintData\&}{ data}}
+
+Assigns print data to this object.
+
+\func{void}{operator $=$}{\param{const wxPrintSetupData\&}{ data}}
+
+Assigns print setup data to this object. wxPrintSetupData is deprecated,
+but retained for backward compatibility.
 
 \section{\class{wxPrintDialog}}\label{wxprintdialog}
 
@@ -167,35 +365,43 @@ a successfully dismissed print dialog.
 \helpref{wxEvtHandler}{wxevthandler}\\
 \helpref{wxObject}{wxobject}
 
+\wxheading{Include files}
+
+<wx/printdlg.h>
+
 \wxheading{See also}
 
 \helpref{wxPrintDialog Overview}{wxprintdialogoverview}
 
 \latexignore{\rtfignore{\wxheading{Members}}}
 
-\membersection{wxPrintDialog::wxPrintDialog}
 
-\func{}{wxPrintDialog}{\param{wxWindow* }{parent}, \param{wxPrintData* }{data = NULL}}
+\membersection{wxPrintDialog::wxPrintDialog}\label{wxprintdialogctor}
+
+\func{}{wxPrintDialog}{\param{wxWindow* }{parent}, \param{wxPrintDialogData* }{data = NULL}}
 
 Constructor. Pass a parent window, and optionally a pointer to a block of print
 data, which will be copied to the print dialog's print data.
 
 \wxheading{See also}
 
-\helpref{wxPrintData}{wxprintdata}
+\helpref{wxPrintDialogData}{wxprintdialogdata}
+
 
-\membersection{wxPrintDialog::\destruct{wxPrintDialog}}
+\membersection{wxPrintDialog::\destruct{wxPrintDialog}}\label{wxprintdialogdtor}
 
 \func{}{\destruct{wxPrintDialog}}{\void}
 
 Destructor. If wxPrintDialog::GetPrintDC has {\it not} been called,
 the device context obtained by the dialog (if any) will be deleted.
 
-\membersection{wxPrintDialog::GetPrintData}\label{wxprintdialoggetprintdata}
 
-\func{wxPrintData\&}{GetPrintData}{\void}
+\membersection{wxPrintDialog::GetPrintDialogData}\label{wxprintdialoggetprintdialogdata}
+
+\func{wxPrintDialogData\&}{GetPrintDialogData}{\void}
+
+Returns the \helpref{print dialog data}{wxprintdialogdata} associated with the print dialog.
 
-Returns the \helpref{print data}{wxprintdata} associated with the print dialog.
 
 \membersection{wxPrintDialog::GetPrintDC}\label{wxprintdialoggetprintdc}
 
@@ -206,6 +412,7 @@ When this function has been called, the ownership of the device context
 is transferred to the application, so it must then be deleted
 explicitly.
 
+
 \membersection{wxPrintDialog::ShowModal}\label{wxprintdialogshowmodal}
 
 \func{int}{ShowModal}{\void}
@@ -214,6 +421,239 @@ Shows the dialog, returning wxID\_OK if the user pressed OK, and wxID\_CANCEL
 otherwise. After this function is called, a device context may
 be retrievable using \helpref{wxPrintDialog::GetPrintDC}{wxprintdialoggetprintdc}.
 
+\section{\class{wxPrintDialogData}}\label{wxprintdialogdata}
+
+This class holds information related to the visual characteristics of wxPrintDialog.
+It contains a wxPrintData object with underlying printing settings.
+
+\wxheading{Derived from}
+
+\helpref{wxObject}{wxobject}
+
+\wxheading{Include files}
+
+<wx/cmndata.h>
+
+\wxheading{See also}
+
+\helpref{wxPrintDialog}{wxprintdialog}, \helpref{wxPrintDialog Overview}{wxprintdialogoverview}
+
+\latexignore{\rtfignore{\wxheading{Members}}}
+
+
+\membersection{wxPrintDialogData::wxPrintDialogData}\label{wxprintdialogdatactor}
+
+\func{}{wxPrintDialogData}{\void}
+
+Default constructor.
+
+\func{}{wxPrintDialogData}{\param{wxPrintDialogData\&}{ dialogData}}
+
+Copy constructor.
+
+\func{}{wxPrintDialogData}{\param{wxPrintData\&}{ printData}}
+
+Construct an object from a print dialog data object.
+
+
+\membersection{wxPrintDialogData::\destruct{wxPrintDialogData}}\label{wxprintdialogdatadtor}
+
+\func{}{\destruct{wxPrintDialogData}}{\void}
+
+Destructor.
+
+
+\membersection{wxPrintDialogData::EnableHelp}\label{wxprintdialogdataenablehelp}
+
+\func{void}{EnableHelp}{\param{bool }{flag}}
+
+Enables or disables the `Help' button.
+
+
+\membersection{wxPrintDialogData::EnablePageNumbers}\label{wxprintdialogdataenablepagenumbers}
+
+\func{void}{EnablePageNumbers}{\param{bool }{flag}}
+
+Enables or disables the `Page numbers' controls.
+
+
+\membersection{wxPrintDialogData::EnablePrintToFile}\label{wxprintdialogdataenableprinttofile}
+
+\func{void}{EnablePrintToFile}{\param{bool }{flag}}
+
+Enables or disables the `Print to file' checkbox.
+
+
+\membersection{wxPrintDialogData::EnableSelection}\label{wxprintdialogdataenableselection}
+
+\func{void}{EnableSelection}{\param{bool }{flag}}
+
+Enables or disables the `Selection' radio button.
+
+
+\membersection{wxPrintDialogData::GetAllPages}\label{wxprintdialogdatagetallpages}
+
+\constfunc{bool}{GetAllPages}{\void}
+
+Returns true if the user requested that all pages be printed.
+
+
+\membersection{wxPrintDialogData::GetCollate}\label{wxprintdialogdatagetcollate}
+
+\constfunc{bool}{GetCollate}{\void}
+
+Returns true if the user requested that the document(s) be collated.
+
+
+\membersection{wxPrintDialogData::GetFromPage}\label{wxprintdialogdatagetfrompage}
+
+\constfunc{int}{GetFromPage}{\void}
+
+Returns the {\it from} page number, as entered by the user.
+
+
+\membersection{wxPrintDialogData::GetMaxPage}\label{wxprintdialogdatagetmaxpage}
+
+\constfunc{int}{GetMaxPage}{\void}
+
+Returns the {\it maximum} page number.
+
+
+\membersection{wxPrintDialogData::GetMinPage}\label{wxprintdialogdatagetminpage}
+
+\constfunc{int}{GetMinPage}{\void}
+
+Returns the {\it minimum} page number.
+
+
+\membersection{wxPrintDialogData::GetNoCopies}\label{wxprintdialogdatagetnocopies}
+
+\constfunc{int}{GetNoCopies}{\void}
+
+Returns the number of copies requested by the user.
+
+
+\membersection{wxPrintDialogData::GetPrintData}\label{wxprintdialogdatagetprintdata}
+
+\func{wxPrintData\&}{GetPrintData}{\void}
+
+Returns a reference to the internal wxPrintData object.
+
+
+\membersection{wxPrintDialogData::GetPrintToFile}\label{wxprintdialogdatagetprinttofile}
+
+\constfunc{bool}{GetPrintToFile}{\void}
+
+Returns true if the user has selected printing to a file.
+
+
+\membersection{wxPrintDialogData::GetSelection}\label{wxprintdialogdatagetselection}
+
+\constfunc{bool}{GetSelection}{\void}
+
+Returns true if the user requested that the selection be printed (where 'selection' is
+a concept specific to the application).
+
+
+\membersection{wxPrintDialogData::GetToPage}\label{wxprintdialogdatagettopage}
+
+\constfunc{int}{GetToPage}{\void}
+
+Returns the {\it to} page number, as entered by the user.
+
+
+\membersection{wxPrintDialogData::Ok}\label{wxprintdialogdataok}
+
+\constfunc{bool}{Ok}{\void}
+
+Returns true if the print data is valid for using in print dialogs.
+This can return false on Windows if the current printer is not set, for example.
+On all other platforms, it returns true.
+
+
+\membersection{wxPrintDialogData::SetCollate}\label{wxprintdialogdatasetcollate}
+
+\func{void}{SetCollate}{\param{bool }{flag}}
+
+Sets the 'Collate' checkbox to true or false.
+
+
+\membersection{wxPrintDialogData::SetFromPage}\label{wxprintdialogdatasetfrompage}
+
+\func{void}{SetFromPage}{\param{int }{page}}
+
+Sets the {\it from} page number.
+
+
+\membersection{wxPrintDialogData::SetMaxPage}\label{wxprintdialogdatasetmaxpage}
+
+\func{void}{SetMaxPage}{\param{int }{page}}
+
+Sets the {\it maximum} page number.
+
+
+\membersection{wxPrintDialogData::SetMinPage}\label{wxprintdialogdatasetminpage}
+
+\func{void}{SetMinPage}{\param{int }{page}}
+
+Sets the {\it minimum} page number.
+
+
+\membersection{wxPrintDialogData::SetNoCopies}\label{wxprintdialogdatasetnocopies}
+
+\func{void}{SetNoCopies}{\param{int }{n}}
+
+Sets the default number of copies the user has requested to be printed out.
+
+
+\membersection{wxPrintDialogData::SetPrintData}\label{wxprintdialogdatasetprintdata}
+
+\func{void}{SetPrintData}{\param{const wxPrintData\& }{printData}}
+
+Sets the internal wxPrintData.
+
+
+\membersection{wxPrintDialogData::SetPrintToFile}\label{wxprintdialogdatasetprinttofile}
+
+\func{void}{SetPrintToFile}{\param{bool }{flag}}
+
+Sets the 'Print to file' checkbox to true or false.
+
+
+\membersection{wxPrintDialogData::SetSelection}\label{wxprintdialogdatasetselection}
+
+\func{void}{SetSelection}{\param{bool}{ flag}}
+
+Selects the 'Selection' radio button. The effect of printing the selection depends on how the application
+implements this command, if at all.
+
+
+\membersection{wxPrintDialogData::SetSetupDialog}\label{wxprintdialogdatasetsetupdialog}
+
+\func{void}{SetSetupDialog}{\param{bool }{flag}}
+
+Determines whether the dialog to be shown will be the Print dialog
+(pass false) or Print Setup dialog (pass true).
+
+This function has been deprecated since version 2.5.4.
+
+\membersection{wxPrintDialogData::SetToPage}\label{wxprintdialogdatasettopage}
+
+\func{void}{SetToPage}{\param{int }{page}}
+
+Sets the {\it to} page number.
+
+
+\membersection{wxPrintDialogData::operator $=$}\label{wxprintdialogdataassign}
+
+\func{void}{operator $=$}{\param{const wxPrintData\&}{ data}}
+
+Assigns print data to this object.
+
+\func{void}{operator $=$}{\param{const wxPrintDialogData\&}{ data}}
+
+Assigns another print dialog data object to this object.
+
 \section{\class{wxPrinter}}\label{wxprinter}
 
 This class represents the Windows or PostScript printer, and is the vehicle through
@@ -226,6 +666,10 @@ method of printing.
 
 \helpref{wxObject}{wxobject}
 
+\wxheading{Include files}
+
+<wx/print.h>
+
 \wxheading{See also}
 
 \helpref{Printing framework overview}{printingoverview}, \helpref{wxPrinterDC}{wxprinterdc}, \helpref{wxPrintDialog}{wxprintdialog},\rtfsp
@@ -233,56 +677,87 @@ method of printing.
 
 \latexignore{\rtfignore{\wxheading{Members}}}
 
-\membersection{wxPrinter::wxPrinter}
 
-\func{}{wxPrinter}{\param{wxPrintData* }{data = NULL}}
+\membersection{wxPrinter::wxPrinter}\label{wxprinterctor}
+
+\func{}{wxPrinter}{\param{wxPrintDialogData* }{data = NULL}}
 
 Constructor. Pass an optional pointer to a block of print
-data, which will be copied to the printer object's print data.
+dialog data, which will be copied to the printer object's local data.
 
 \wxheading{See also}
 
+\helpref{wxPrintDialogData}{wxprintdialogdata},
 \helpref{wxPrintData}{wxprintdata}
 
-\membersection{wxPrinter::\destruct{wxPrinter}}
 
-\func{}{\destruct{wxPrinter}}{\void}
 
-Destructor.
+\membersection{wxPrinter::CreateAbortWindow}\label{wxprintercreateabortwindow}
 
-\membersection{wxPrinter::Abort}\label{wxprinterabort}
+\func{void}{CreateAbortWindow}{\param{wxWindow* }{parent}, \param{wxPrintout* }{printout}}
 
-\func{bool}{Abort}{\void}
+Creates the default printing abort window, with a cancel button.
 
-Returns TRUE if the user has aborted the print job.
 
-\membersection{wxPrinter::CreateAbortWindow}\label{wxprintercreateabortwindow}
+\membersection{wxPrinter::GetAbort}\label{wxprintergetabort}
 
-\func{void}{CreateAbortWindow}{\param{wxWindow* }{parent}, \param{wxPrintout* }{printout}}
+\func{bool}{GetAbort}{\void}
 
-Creates the default printing abort window, with a cancel button.
+Returns true if the user has aborted the print job.
 
-\membersection{wxPrinter::GetPrintData}\label{wxprintergetprintdata}
 
-\func{wxPrintData\&}{GetPrintData}{\void}
+\membersection{wxPrinter::GetLastError}\label{wxprintergetlasterror}
+
+\func{static wxPrinterError}{GetLastError}{\void}
+
+Return last error. Valid after calling \helpref{Print}{wxprinterprint},
+\helpref{PrintDialog}{wxprinterprintdialog} or 
+\helpref{wxPrintPreview::Print}{wxprintpreviewprint}. These functions 
+set last error to {\bf wxPRINTER\_NO\_ERROR} if no error happened.
+
+Returned value is one of the following:
+
+\twocolwidtha{7cm}
+\begin{twocollist}\itemsep=0pt
+\twocolitem{{\bf wxPRINTER\_NO\_ERROR}}{No error happened.}
+\twocolitem{{\bf wxPRINTER\_CANCELLED}}{The user cancelled printing.}
+\twocolitem{{\bf wxPRINTER\_ERROR}}{There was an error during printing.}
+\end{twocollist}
+
+
+
+\membersection{wxPrinter::GetPrintDialogData}\label{wxprintergetprintdialogdata}
+
+\func{wxPrintDialogData\&}{GetPrintDialogData}{\void}
 
 Returns the \helpref{print data}{wxprintdata} associated with the printer object.
 
+
 \membersection{wxPrinter::Print}\label{wxprinterprint}
 
-\func{bool}{Print}{\param{wxWindow *}{parent}, \param{wxPrintout *}{printout}, \param{bool }{prompt=TRUE}}
+\func{bool}{Print}{\param{wxWindow *}{parent}, \param{wxPrintout *}{printout}, \param{bool }{prompt=true}}
 
 Starts the printing process. Provide a parent window, a user-defined wxPrintout object which controls
 the printing of a document, and whether the print dialog should be invoked first.
 
-Print could return FALSE if there was a problem initializing the printer device context
-(current printer not set, for example).
+Print could return false if there was a problem initializing the printer device context
+(current printer not set, for example) or the user cancelled printing. Call
+\helpref{wxPrinter::GetLastError}{wxprintergetlasterror} to get detailed
+information about the kind of the error.
+
 
 \membersection{wxPrinter::PrintDialog}\label{wxprinterprintdialog}
 
-\func{bool}{PrintDialog}{\param{wxWindow *}{parent}}
+\func{wxDC*}{PrintDialog}{\param{wxWindow *}{parent}}
+
+Invokes the print dialog. If successful (the user did not press Cancel
+and no error occurred), a suitable device context will be returned
+(otherwise NULL is returned -- call
+\helpref{wxPrinter::GetLastError}{wxprintergetlasterror} to get detailed
+information about the kind of the error).
+
+The application must delete this device context to avoid a memory leak.
 
-Invokes the print dialog.
 
 \membersection{wxPrinter::ReportError}\label{wxprinterreporterror}
 
@@ -290,9 +765,10 @@ Invokes the print dialog.
 
 Default error-reporting function.
 
+
 \membersection{wxPrinter::Setup}\label{wxprintersetup}
 
-\func{void}{Setup}{\param{wxWindow *}{parent}}
+\func{bool}{Setup}{\param{wxWindow *}{parent}}
 
 Invokes the print setup dialog. Note that the setup dialog is obsolete from
 Windows 95, though retained for backward compatibility.
@@ -309,22 +785,38 @@ achieving the correct scaling for the page.
 \helpref{wxDC}{wxdc}\\
 \helpref{wxObject}{wxdc}
 
+\wxheading{Include files}
+
+<wx/dcprint.h>
+
 \wxheading{See also}
 
 \helpref{wxDC}{wxdc}, \helpref{Printing framework overview}{printingoverview}
 
 \latexignore{\rtfignore{\wxheading{Members}}}
 
-\membersection{wxPrinterDC::wxPrinterDC}
+
+\membersection{wxPrinterDC::wxPrinterDC}\label{wxprinterdcctor}
+
+\func{}{wxPrinterDC}{\param{const wxPrintData\& }{printData}}
+
+Pass a \helpref{wxPrintData}{wxprintdata} object with information
+necessary for setting up a suitable printer device context. This
+is the recommended way to construct a wxPrinterDC.  Make sure you 
+specify a reference to a \helpref{wxPrintData}{wxprintdata} object,
+not a pointer - you may not even get a warning if you pass a pointer
+instead.
 
 \func{}{wxPrinterDC}{\param{const wxString\& }{driver}, \param{const wxString\& }{device}, \param{const wxString\& }{output},
- \param{const bool }{interactive = TRUE}, \param{int }{orientation = wxPORTRAIT}}
+ \param{const bool }{interactive = true}, \param{int }{orientation = wxPORTRAIT}}
 
 Constructor. With empty strings for the first three arguments, the default printer dialog is
 displayed. {\it device} indicates the type of printer and {\it output}
 is an optional file for printing to. The {\it driver} parameter is
 currently unused.  Use the {\it Ok} member to test whether the
-constructor was successful in creating a useable device context.
+constructor was successful in creating a usable device context.
+
+This constructor is deprecated and retained only for backward compatibility.
 
 \section{\class{wxPrintout}}\label{wxprintout}
 
@@ -338,6 +830,10 @@ wxPrintPreview object to initiate printing or previewing.
 
 \helpref{wxObject}{wxobject}
 
+\wxheading{Include files}
+
+<wx/print.h>
+
 \wxheading{See also}
 
 \helpref{Printing framework overview}{printingoverview}, \helpref{wxPrinterDC}{wxprinterdc}, \helpref{wxPrintDialog}{wxprintdialog},\rtfsp
@@ -345,18 +841,22 @@ wxPrintPreview object to initiate printing or previewing.
 
 \latexignore{\rtfignore{\wxheading{Members}}}
 
-\membersection{wxPrintout::wxPrintout}
+
+\membersection{wxPrintout::wxPrintout}\label{wxprintoutctor}
 
 \func{}{wxPrintout}{\param{const wxString\& }{title = "Printout"}}
 
-Constructor. Pass an optional title argument (currently unused).
+Constructor. Pass an optional title argument - the current filename would be a good idea. This will appear in the printing list
+(at least in MSW)
+
 
-\membersection{wxPrintout::\destruct{wxPrintout}}
+\membersection{wxPrintout::\destruct{wxPrintout}}\label{wxprintoutdtor}
 
 \func{}{\destruct{wxPrintout}}{\void}
 
 Destructor.
 
+
 \membersection{wxPrintout::GetDC}\label{wxprintoutgetdc}
 
 \func{wxDC *}{GetDC}{\void}
@@ -365,6 +865,7 @@ Returns the device context associated with the printout (given to the printout a
 printing or previewing). This will be a wxPrinterDC if printing under Windows,
 a wxPostScriptDC if printing on other platforms, and a wxMemoryDC if previewing.
 
+
 \membersection{wxPrintout::GetPageInfo}\label{wxprintoutgetpageinfo}
 
 \func{void}{GetPageInfo}{\param{int *}{minPage}, \param{int *}{maxPage}, \param{int *}{pageFrom}, \param{int *}{pageTo}}
@@ -375,12 +876,28 @@ returns 1, 32000 for the page minimum and maximum values, and 1, 1 for the requi
 
 If {\it minPage} is zero, the page number controls in the print dialog will be disabled.
 
+\pythonnote{When this method is implemented in a derived Python class,
+it should be designed to take no parameters (other than the self
+reference) and to return a tuple of four integers.
+}
+
+\perlnote{When this method is overridden in a derived class,
+it must not take any parameters, and returns a 4-element list.
+}
+
+
 \membersection{wxPrintout::GetPageSizeMM}\label{wxprintoutgetpagesizemm}
 
 \func{void}{GetPageSizeMM}{\param{int *}{w}, \param{int *}{h}}
 
 Returns the size of the printer page in millimetres.
 
+\pythonnote{This method returns the output-only parameters as a tuple.}
+
+\perlnote{In wxPerl this method takes no arguments and returns a
+2-element list {\tt ( w, h )}}
+
+
 \membersection{wxPrintout::GetPageSizePixels}\label{wxprintoutgetpagesizepixels}
 
 \func{void}{GetPageSizePixels}{\param{int *}{w}, \param{int *}{h}}
@@ -392,6 +909,12 @@ memory device context is used, using a bitmap size reflecting the current
 preview zoom. The application must take this discrepancy into account if
 previewing is to be supported.
 
+\pythonnote{This method returns the output-only parameters as a tuple.}
+
+\perlnote{In wxPerl this method takes no arguments and returns a
+2-element list {\tt ( w, h )}}
+
+
 \membersection{wxPrintout::GetPPIPrinter}\label{wxprintoutgetppiprinter}
 
 \func{void}{GetPPIPrinter}{\param{int *}{w}, \param{int *}{h}}
@@ -401,6 +924,12 @@ Dividing the printer PPI by the screen PPI can give a suitable scaling
 factor for drawing text onto the printer. Remember to multiply
 this by a scaling factor to take the preview DC size into account.
 
+\pythonnote{This method returns the output-only parameters as a tuple.}
+
+\perlnote{In wxPerl this method takes no arguments and returns a
+2-element list {\tt ( w, h )}}
+
+
 \membersection{wxPrintout::GetPPIScreen}\label{wxprintoutgetppiscreen}
 
 \func{void}{GetPPIScreen}{\param{int *}{w}, \param{int *}{h}}
@@ -410,30 +939,50 @@ Dividing the printer PPI by the screen PPI can give a suitable scaling
 factor for drawing text onto the printer. Remember to multiply
 this by a scaling factor to take the preview DC size into account.
 
+
+\membersection{wxPrintout::GetTitle}\label{wxprintoutgettitle}
+
+\func{wxString}{GetTitle}{\void}
+
+Returns the title of the printout
+
+\pythonnote{This method returns the output-only parameters as a tuple.}
+
+\perlnote{In wxPerl this method takes no arguments and returns a
+2-element list {\tt ( w, h )}}
+
+
 \membersection{wxPrintout::HasPage}\label{wxprintouthaspage}
 
 \func{bool}{HasPage}{\param{int}{ pageNum}}
 
-Should be overriden to return TRUE if the document has this page, or FALSE
-if not. Returning FALSE signifies the end of the document. By default,
+Should be overridden to return true if the document has this page, or false
+if not. Returning false signifies the end of the document. By default,
 HasPage behaves as if the document has only one page.
 
+
 \membersection{wxPrintout::IsPreview}\label{wxprintoutispreview}
 
 \func{bool}{IsPreview}{\void}
 
-Returns TRUE if the printout is currently being used for previewing.
+Returns true if the printout is currently being used for previewing.
+
 
 \membersection{wxPrintout::OnBeginDocument}\label{wxprintoutonbegindocument}
 
 \func{bool}{OnBeginDocument}{\param{int}{ startPage}, \param{int}{ endPage}}
 
-Called by the framework at the start of document printing. Return FALSE from
+Called by the framework at the start of document printing. Return false from
 this function cancels the print job. OnBeginDocument is called once for every
 copy printed.
 
 The base wxPrintout::OnBeginDocument {\it must} be called (and the return value
-checked) from within the overriden function, since it calls wxDC::StartDoc.
+checked) from within the overridden function, since it calls wxDC::StartDoc.
+
+\pythonnote{If this method is overridden in a Python class then the
+base class version can be called by using the method
+{\tt base\_OnBeginDocument(startPage, endPage)}. }
+
 
 \membersection{wxPrintout::OnEndDocument}\label{wxprintoutonenddocument}
 
@@ -443,7 +992,8 @@ Called by the framework at the end of document printing. OnEndDocument
 is called once for every copy printed.
 
 The base wxPrintout::OnEndDocument {\it must} be called
-from within the overriden function, since it calls wxDC::EndDoc.
+from within the overridden function, since it calls wxDC::EndDoc.
+
 
 \membersection{wxPrintout::OnBeginPrinting}\label{wxprintoutonbeginprinting}
 
@@ -452,6 +1002,7 @@ from within the overriden function, since it calls wxDC::EndDoc.
 Called by the framework at the start of printing. OnBeginPrinting is called once for every
 print job (regardless of how many copies are being printed).
 
+
 \membersection{wxPrintout::OnEndPrinting}\label{wxprintoutonendprinting}
 
 \func{void}{OnEndPrinting}{\void}
@@ -459,6 +1010,7 @@ print job (regardless of how many copies are being printed).
 Called by the framework at the end of printing. OnEndPrinting
 is called once for every print job (regardless of how many copies are being printed).
 
+
 \membersection{wxPrintout::OnPreparePrinting}\label{wxprintoutonprepareprinting}
 
 \func{void}{OnPreparePrinting}{\void}
@@ -467,18 +1019,17 @@ Called once by the framework before any other demands are made of the
 wxPrintout object. This gives the object an opportunity to calculate the
 number of pages in the document, for example.
 
+
 \membersection{wxPrintout::OnPrintPage}\label{wxprintoutonprintpage}
 
 \func{bool}{OnPrintPage}{\param{int}{ pageNum}}
 
-Called by the framework when a page should be printed. Returning FALSE cancels
+Called by the framework when a page should be printed. Returning false cancels
 the print job. The application can use wxPrintout::GetDC to obtain a device
 context to draw on.
 
 \section{\class{wxPrintPreview}}\label{wxprintpreview}
 
-\overview{Printing framework overview}{printingoverview}
-
 Objects of this class manage the print preview process. The object is passed
 a wxPrintout object, and the wxPrintPreview object itself is passed to
 a wxPreviewFrame object. Previewing is started by initializing and showing
@@ -489,6 +1040,10 @@ immediately after the frame is shown.
 
 \helpref{wxObject}{wxobject}
 
+\wxheading{Include files}
+
+<wx/print.h>
+
 \wxheading{See also}
 
 \overview{Printing framework overview}{printingoverview}, \helpref{wxPrinterDC}{wxprinterdc}, \helpref{wxPrintDialog}{wxprintdialog},\rtfsp
@@ -498,7 +1053,8 @@ immediately after the frame is shown.
 
 \latexignore{\rtfignore{\wxheading{Members}}}
 
-\membersection{wxPrintPreview::wxPrintPreview}
+
+\membersection{wxPrintPreview::wxPrintPreview}\label{wxprintpreviewctor}
 
 \func{}{wxPrintPreview}{\param{wxPrintout* }{printout}, \param{wxPrintout* }{printoutForPrinting},
 \param{wxPrintData* }{data=NULL}}
@@ -516,35 +1072,32 @@ called, since they will be deleted in the wxPrintPreview constructor.
 The same does not apply to the {\it data} argument.
 
 Test the Ok member to check whether the wxPrintPreview object was created correctly.
-Ok could return FALSE if there was a problem initializing the printer device context
+Ok could return false if there was a problem initializing the printer device context
 (current printer not set, for example).
 
-\membersection{wxPrintPreview::\destruct{wxPrintPreview}}
+
+\membersection{wxPrintPreview::\destruct{wxPrintPreview}}\label{wxprintpreviewdtor}
 
 \func{}{\destruct{wxPrinter}}{\void}
 
 Destructor. Deletes both print preview objects, so do not destroy these objects
 in your application.
 
-\membersection{wxPrintPreview::DrawBlankPage}\label{wxprintpreviewdrawblankpage}
-
-\func{bool}{DrawBlankPage}{\param{wxWindow* }{window}}
-
-Draws a representation of the blank page into the preview window. Used
-internally.
 
 \membersection{wxPrintPreview::GetCanvas}\label{wxprintpreviewgetcanvas}
 
-\func{wxWindow* }{GetCanvas}{\void}
+\func{wxPreviewCanvas* }{GetCanvas}{\void}
 
 Gets the preview window used for displaying the print preview image.
 
+
 \membersection{wxPrintPreview::GetCurrentPage}\label{wxprintpreviewgetcurrentpage}
 
 \func{int}{GetCurrentPage}{\void}
 
 Gets the page currently being previewed.
 
+
 \membersection{wxPrintPreview::GetFrame}\label{wxprintpreviewgetframe}
 
 \func{wxFrame *}{GetFrame}{\void}
@@ -552,23 +1105,20 @@ Gets the page currently being previewed.
 Gets the frame used for displaying the print preview canvas
 and control bar.
 
+
 \membersection{wxPrintPreview::GetMaxPage}\label{wxprintpreviewgetmaxpage}
 
 \func{int}{GetMaxPage}{\void}
 
 Returns the maximum page number.
 
+
 \membersection{wxPrintPreview::GetMinPage}\label{wxprintpreviewgetminpage}
 
 \func{int}{GetMinPage}{\void}
 
 Returns the minimum page number.
 
-\membersection{wxPrintPreview::GetPrintData}\label{wxprintpreviewgetprintdata}
-
-\func{wxPrintData\&}{GetPrintData}{\void}
-
-Returns a reference to the internal print data.
 
 \membersection{wxPrintPreview::GetPrintout}\label{wxprintpreviewgetprintout}
 
@@ -576,6 +1126,7 @@ Returns a reference to the internal print data.
 
 Gets the preview printout object associated with the wxPrintPreview object.
 
+
 \membersection{wxPrintPreview::GetPrintoutForPrinting}\label{wxprintpreviewgetprintoutforprinting}
 
 \func{wxPrintout *}{GetPrintoutForPrinting}{\void}
@@ -583,16 +1134,18 @@ Gets the preview printout object associated with the wxPrintPreview object.
 Gets the printout object to be used for printing from within the preview interface,
 or NULL if none exists.
 
+
 \membersection{wxPrintPreview::Ok}\label{wxprintpreviewok}
 
 \func{bool}{Ok}{\void}
 
-Returns TRUE if the wxPrintPreview is valid, FALSE otherwise. It could return FALSE if there was a
+Returns true if the wxPrintPreview is valid, false otherwise. It could return false if there was a
 problem initializing the printer device context (current printer not set, for example).
 
+
 \membersection{wxPrintPreview::PaintPage}\label{wxprintpreviewpaintpage}
 
-\func{bool}{PaintPage}{\param{wxWindow* }{window}}
+\func{bool}{PaintPage}{\param{wxPreviewCanvas *}{canvas}, \param{wxDC& }{dc}}
 
 This refreshes the preview window with the preview image.
 It must be called from the preview window's OnPaint member.
@@ -600,6 +1153,7 @@ It must be called from the preview window's OnPaint member.
 The implementation simply blits the preview bitmap onto
 the canvas, creating a new preview bitmap if none exists.
 
+
 \membersection{wxPrintPreview::Print}\label{wxprintpreviewprint}
 
 \func{bool}{Print}{\param{bool }{prompt}}
@@ -609,24 +1163,32 @@ supplied in the wxPrintPreview constructor.
 Will normally be called by the {\bf Print...} panel item on the
 preview frame's control bar.
 
+Returns false in case of error -- call
+\helpref{wxPrinter::GetLastError}{wxprintergetlasterror} to get detailed
+information about the kind of the error.
+
+
 \membersection{wxPrintPreview::RenderPage}\label{wxprintpreviewrenderpage}
 
 \func{bool}{RenderPage}{\param{int }{pageNum}}
 
 Renders a page into a wxMemoryDC. Used internally by wxPrintPreview.
 
+
 \membersection{wxPrintPreview::SetCanvas}\label{wxprintpreviewsetcanvas}
 
-\func{void}{SetCanvas}{\param{wxWindow* }{window}}
+\func{void}{SetCanvas}{\param{wxPreviewCanvas* }{window}}
 
 Sets the window to be used for displaying the print preview image.
 
+
 \membersection{wxPrintPreview::SetCurrentPage}\label{wxprintpreviewsetcurrentpage}
 
 \func{void}{SetCurrentPage}{\param{int}{ pageNum}}
 
 Sets the current page to be previewed.
 
+
 \membersection{wxPrintPreview::SetFrame}\label{wxprintpreviewsetframe}
 
 \func{void}{SetFrame}{\param{wxFrame *}{frame}}
@@ -634,12 +1196,14 @@ Sets the current page to be previewed.
 Sets the frame to be used for displaying the print preview canvas
 and control bar.
 
+
 \membersection{wxPrintPreview::SetPrintout}\label{wxprintpreviewsetprintout}
 
 \func{void}{SetPrintout}{\param{wxPrintout *}{printout}}
 
 Associates a printout object with the wxPrintPreview object.
 
+
 \membersection{wxPrintPreview::SetZoom}\label{wxprintpreviewsetzoom}
 
 \func{void}{SetZoom}{\param{int}{ percent}}
@@ -647,4 +1211,3 @@ Associates a printout object with the wxPrintPreview object.
 Sets the percentage preview zoom, and refreshes the preview canvas
 accordingly.
 
-
