X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/eaaa6a06a25774c18d10bb8182cc1934ed0ed9aa..4d0f3cd6ac9b38521b35f21cb94ef7d72aa34b9e:/docs/latex/wx/mdi.tex

diff --git a/docs/latex/wx/mdi.tex b/docs/latex/wx/mdi.tex
index 11666e82c5..64d7d75eb9 100644
--- a/docs/latex/wx/mdi.tex
+++ b/docs/latex/wx/mdi.tex
@@ -10,6 +10,10 @@ which is itself a child of \helpref{wxMDIParentFrame}{wxmdiparentframe}.
 \helpref{wxEvtHandler}{wxevthandler}\\
 \helpref{wxObject}{wxobject}
 
+\wxheading{Include files}
+
+<wx/mdi.h>
+
 \wxheading{Window styles}
 
 \twocolwidtha{5cm}
@@ -153,6 +157,10 @@ more \helpref{wxMDIChildFrame}{wxmdichildframe} objects.
 \helpref{wxEvtHandler}{wxevthandler}\\
 \helpref{wxObject}{wxobject}
 
+\wxheading{Include files}
+
+<wx/mdi.h>
+
 \wxheading{Remarks}
 
 The client window is the area where MDI child windows exist. It doesn't have to cover the whole
@@ -225,6 +233,10 @@ and is used in many popular Windows applications, such as Microsoft Word(TM).
 \helpref{wxEvtHandler}{wxevthandler}\\
 \helpref{wxObject}{wxobject}
 
+\wxheading{Include files}
+
+<wx/mdi.h>
+
 \wxheading{Remarks}
 
 There may be multiple MDI parent frames in a single application, but this probably only makes sense
@@ -422,6 +434,10 @@ automatically by the client window.
 \helpref{wxWindow}{wxwindowonsize},\rtfsp
 \helpref{wxMDIClientWindow}{wxmdiclientwindow}
 
+
+\pythonnote{The wxPython version of this method takes no arguments and
+returns a tuple containing width and height.}
+
 \membersection{wxMDIParentFrame::GetActiveChild}\label{wxmdiparentframegetactivechild}
 
 \constfunc{wxMDIChildFrame*}{GetActiveChild}{\void}
