X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/eaaa6a06a25774c18d10bb8182cc1934ed0ed9aa..4033be7874eecafea789adcf3c2efe3e32b43809:/docs/latex/wx/frame.tex

diff --git a/docs/latex/wx/frame.tex b/docs/latex/wx/frame.tex
index a41ddd02f2..d145636166 100644
--- a/docs/latex/wx/frame.tex
+++ b/docs/latex/wx/frame.tex
@@ -1,37 +1,95 @@
 \section{\class{wxFrame}}\label{wxframe}
 
-A frame is a window whose size and position can (usually) be changed by the user. It usually has
-thick borders and a title bar, and can optionally contain a menu bar, toolbar and
-status bar. A frame can contain any window that is not a frame or dialog.
+A frame is a window whose size and position can (usually) be changed by the
+user. It usually has thick borders and a title bar, and can optionally contain
+a menu bar, toolbar and status bar. A frame can contain any window that is not
+a frame or dialog.
+
+A frame that has a status bar and toolbar created via the
+CreateStatusBar/CreateToolBar functions manages these windows, and adjusts the
+value returned by GetClientSize to reflect the remaining size available to
+application windows.
 
 \wxheading{Derived from}
 
+\helpref{wxTopLevelWindow}{wxtoplevelwindow}\\
 \helpref{wxWindow}{wxwindow}\\
 \helpref{wxEvtHandler}{wxevthandler}\\
 \helpref{wxObject}{wxobject}
 
+\wxheading{Include files}
+
+<wx/frame.h>
+
 \wxheading{Window styles}
 
 \twocolwidtha{5cm}
 \begin{twocollist}\itemsep=0pt
-\twocolitem{\windowstyle{wxICONIZE}}{Display the frame iconized (minimized) (Windows only).}
+\twocolitem{\windowstyle{wxDEFAULT\_FRAME\_STYLE}}{Defined as {\bf wxMINIMIZE\_BOX \pipe wxMAXIMIZE\_BOX \pipe wxRESIZE\_BORDER \pipe wxSYSTEM\_MENU \pipe wxCAPTION \pipe wxCLOSE\_BOX \pipe wxCLIP\_CHILDREN}.}
+\twocolitem{\windowstyle{wxICONIZE}}{Display the frame iconized (minimized). Windows only. }
 \twocolitem{\windowstyle{wxCAPTION}}{Puts a caption on the frame.}
-\twocolitem{\windowstyle{wxDEFAULT\_FRAME\_STYLE}}{Defined as {\bf wxMINIMIZE\_BOX \pipe wxMAXIMIZE\_BOX \pipe wxTHICK\_FRAME \pipe wxSYSTEM\_MENU \pipe wxCAPTION}.}
-\twocolitem{\windowstyle{wxMINIMIZE}}{Identical to {\bf wxICONIZE}.}
-\twocolitem{\windowstyle{wxMINIMIZE\_BOX}}{Displays a minimize box on the frame (Windows and Motif only).}
-\twocolitem{\windowstyle{wxMAXIMIZE}}{Displays the frame maximized (Windows only).}
-\twocolitem{\windowstyle{wxMAXIMIZE\_BOX}}{Displays a maximize box on the frame (Windows and Motif only).}
-\twocolitem{\windowstyle{wxSTAY\_ON\_TOP}}{Stay on top of other windows (Windows only).}
-\twocolitem{\windowstyle{wxSYSTEM\_MENU}}{Displays a system menu (Windows and Motif only).}
-\twocolitem{\windowstyle{wxTHICK\_FRAME}}{Displays a thick frame around the window (Windows and Motif only).}
-\twocolitem{\windowstyle{wxRESIZE\_BORDER}}{Displays a resizeable border around the window (Motif only).}
+\twocolitem{\windowstyle{wxMINIMIZE}}{Identical to {\bf wxICONIZE}. Windows only.}
+\twocolitem{\windowstyle{wxMINIMIZE\_BOX}}{Displays a minimize box on the frame.}
+\twocolitem{\windowstyle{wxMAXIMIZE}}{Displays the frame maximized. Windows only.}
+\twocolitem{\windowstyle{wxMAXIMIZE\_BOX}}{Displays a maximize box on the frame.}
+\twocolitem{\windowstyle{wxCLOSE\_BOX}}{Displays a close box on the frame.}
+\twocolitem{\windowstyle{wxSTAY\_ON\_TOP}}{Stay on top of all other windows,
+see also wxFRAME\_FLOAT\_ON\_PARENT.}
+\twocolitem{\windowstyle{wxSYSTEM\_MENU}}{Displays a system menu.}
+\twocolitem{\windowstyle{wxRESIZE\_BORDER}}{Displays a resizeable border around the window.}
+\twocolitem{\windowstyle{wxFRAME\_TOOL\_WINDOW}}{Causes a frame with a small
+titlebar to be created; the frame does not appear in the taskbar under Windows or GTK+.}
+\twocolitem{\windowstyle{wxFRAME\_NO\_TASKBAR}}{Creates an otherwise normal
+frame but it does not appear in the taskbar under Windows or GTK+ (note that it
+will minimize to the desktop window under Windows which may seem strange to the
+users and thus it might be better to use this style only without
+wxMINIMIZE\_BOX style). In wxGTK, the flag is respected only if GTK+ is at
+least version 2.2 and the window manager supports 
+\urlref{\_NET\_WM\_STATE\_SKIP\_TASKBAR}{http://freedesktop.org/Standards/wm-spec/1.3/ar01s05.html} hint.
+Has no effect under other platforms.}
+\twocolitem{\windowstyle{wxFRAME\_FLOAT\_ON\_PARENT}}{The frame will always be
+on top of its parent (unlike wxSTAY\_ON\_TOP). A frame created with this style
+must have a non-NULL parent.}
+\twocolitem{\windowstyle{wxFRAME\_EX\_CONTEXTHELP}}{Under Windows, puts a query button on the
+caption. When pressed, Windows will go into a context-sensitive help mode and wxWidgets will send
+a wxEVT\_HELP event if the user clicked on an application window. {\it Note} that this is an extended
+style and must be set by calling \helpref{SetExtraStyle}{wxwindowsetextrastyle} before Create is called (two-step construction).
+You cannot use this style together with wxMAXIMIZE\_BOX or wxMINIMIZE\_BOX, so
+you should use\rtfsp
+{\tt wxDEFAULT\_FRAME\_STYLE \& ~ (wxMINIMIZE\_BOX | wxMAXIMIZE\_BOX)} for the
+frames having this style (the dialogs don't have a minimize or a maximize box by
+default)}
+\twocolitem{\windowstyle{wxFRAME\_SHAPED}}{Windows with this style are
+  allowed to have their shape changed with the \helpref{SetShape}{wxtoplevelwindowsetshape} method.}
+\twocolitem{\windowstyle{wxFRAME\_EX\_METAL}}{On Mac OS X, frames with this style will be shown with a metallic look. This is an {\it extra} style.}
 \end{twocollist}
 
+The default frame style is for normal, resizeable frames. To create a frame
+which can not be resized by user, you may use the following combination of
+styles: {\tt wxDEFAULT\_FRAME\_STYLE \& ~ (wxRESIZE\_BORDER \pipe wxRESIZE\_BOX \pipe wxMAXIMIZE\_BOX)}.
+% Note: the space after the tilde is necessary or Tex2RTF complains.
+
 See also \helpref{window styles overview}{windowstyles}.
 
+\wxheading{Default event processing}
+
+wxFrame processes the following events:
+
+\begin{twocollist}\itemsep=0pt
+\twocolitem{\helpref{wxEVT\_SIZE}{wxsizeevent}}{If the frame has exactly one
+child window, not counting the status and toolbar, this child is resized to
+take the entire frame client area. If two or more windows are present, they
+should be laid out explicitly either by manually handling wxEVT\_SIZE or using
+\helpref{sizers}{sizeroverview}}
+
+\twocolitem{\helpref{wxEVT\_MENU\_HIGHLIGHT}{wxmenuevent}}{The default
+implementation displays the \helpref{help string}{wxmenuitemgethelp} associated
+with the selected item in the first pane of the status bar, if there is one.}
+\end{twocollist}
+
 \wxheading{Remarks}
 
-An application should normally define an \helpref{OnCloseWindow}{wxwindowonclosewindow} handler for the
+An application should normally define an \helpref{wxCloseEvent}{wxcloseevent} handler for the
 frame to respond to system close events, for example so that related data and subwindows can be cleaned up.
 
 \wxheading{See also}
@@ -41,7 +99,7 @@ frame to respond to system close events, for example so that related data and su
 
 \latexignore{\rtfignore{\wxheading{Members}}}
 
-\membersection{wxFrame::wxFrame}\label{wxframeconstr}
+\membersection{wxFrame::wxFrame}\label{wxframector}
 
 \func{}{wxFrame}{\void}
 
@@ -64,10 +122,10 @@ always be displayed on top of the parent window on Windows.}
 \docparam{title}{The caption to be displayed on the frame's title bar.}
 
 \docparam{pos}{The window position. A value of (-1, -1) indicates a default position, chosen by
-either the windowing system or wxWindows, depending on platform.}
+either the windowing system or wxWidgets, depending on platform.}
 
 \docparam{size}{The window size. A value of (-1, -1) indicates a default size, chosen by
-either the windowing system or wxWindows, depending on platform.}
+either the windowing system or wxWidgets, depending on platform.}
 
 \docparam{style}{The window style. See \helpref{wxFrame}{wxframe}.}
 
@@ -84,7 +142,7 @@ For Motif, MWM (the Motif Window Manager) should be running for any window style
 
 \helpref{wxFrame::Create}{wxframecreate}
 
-\membersection{wxFrame::\destruct{wxFrame}}
+\membersection{wxFrame::\destruct{wxFrame}}\label{wxframedtor}
 
 \func{void}{\destruct{wxFrame}}{\void}
 
@@ -100,16 +158,6 @@ Centres the frame on the display.
 
 \docparam{direction}{The parameter may be {\tt wxHORIZONTAL}, {\tt wxVERTICAL} or {\tt wxBOTH}.}
 
-\membersection{wxFrame::Command}\label{wxframecommand}
-
-\func{void}{Command}{\param{int }{id}}
-
-Simulate a menu command.
-
-\wxheading{Parameters}
-
-\docparam{id}{The identifier for a menu item.}
-
 \membersection{wxFrame::Create}\label{wxframecreate}
 
 \func{bool}{Create}{\param{wxWindow* }{parent}, \param{wxWindowID }{id},\rtfsp
@@ -117,12 +165,14 @@ Simulate a menu command.
 \param{const wxSize\&}{ size = wxDefaultSize}, \param{long}{ style = wxDEFAULT\_FRAME\_STYLE},\rtfsp
 \param{const wxString\& }{name = ``frame"}}
 
-Used in two-step frame construction. See \helpref{wxFrame::wxFrame}{wxframeconstr}\rtfsp
+Used in two-step frame construction. See \helpref{wxFrame::wxFrame}{wxframector}\rtfsp
 for further details.
 
 \membersection{wxFrame::CreateStatusBar}\label{wxframecreatestatusbar}
 
-\func{virtual bool}{CreateStatusBar}{\param{int}{ number = 1}}
+\func{virtual wxStatusBar*}{CreateStatusBar}{\param{int}{ number = 1},
+ \param{long}{ style = 0},
+ \param{wxWindowID}{ id = -1}, \param{const wxString\&}{ name = "statusBar"}}
 
 Creates a status bar at the bottom of the frame.
 
@@ -131,9 +181,17 @@ Creates a status bar at the bottom of the frame.
 \docparam{number}{The number of fields to create. Specify a
 value greater than 1 to create a multi-field status bar.}
 
+\docparam{style}{The status bar style. See \helpref{wxStatusBar}{wxstatusbar} for a list
+of valid styles.}
+
+\docparam{id}{The status bar window identifier. If -1, an identifier will be chosen by
+wxWidgets.}
+
+\docparam{name}{The status bar window name.}
+
 \wxheading{Return value}
 
-TRUE if the status bar was created successfully.
+A pointer to the status bar if it was created successfully, NULL otherwise.
 
 \wxheading{Remarks}
 
@@ -151,125 +209,103 @@ Note that you can put controls and other windows on the status bar if you wish.
 \helpref{wxFrame::OnCreateStatusBar}{wxframeoncreatestatusbar},\rtfsp
 \helpref{wxFrame::GetStatusBar}{wxframegetstatusbar}
 
-\membersection{wxFrame::GetMenuBar}\label{wxframegetmenubar}
+\membersection{wxFrame::CreateToolBar}\label{wxframecreatetoolbar}
 
-\constfunc{wxMenuBar*}{GetMenuBar}{\void}
+\func{virtual wxToolBar*}{CreateToolBar}{\param{long}{ style = wxNO\_BORDER \pipe wxTB\_HORIZONTAL},
+ \param{wxWindowID}{ id = -1}, \param{const wxString\&}{ name = "toolBar"}}
 
-Returns a pointer to the menubar currently associated with the frame (if any).
-
-\wxheading{See also}
-
-\helpref{wxFrame::SetMenuBar}{wxframesetmenubar}, \helpref{wxMenuBar}{wxmenubar}, \helpref{wxMenu}{wxmenu}
-
-\membersection{wxFrame::GetStatusBar}\label{wxframegetstatusbar}
-
-\func{wxStatusBar*}{GetStatusBar}{\void}
-
-Returns a pointer to the status bar currently associated with the frame (if any).
-
-\wxheading{See also}
-
-\helpref{wxFrame::CreateStatusBar}{wxframecreatestatusbar}, \helpref{wxStatusBar}{wxstatusbar}
-
-\membersection{wxFrame::GetTitle}\label{wxframegettitle}
-
-\func{wxString\&}{GetTitle}{\void}
-
-Gets a temporary pointer to the frame title. See
-\helpref{wxFrame::SetTitle}{wxframesettitle}.
-
-\membersection{wxFrame::Iconize}\label{wxframeiconize}
-
-\func{void}{Iconize}{\param{const bool}{ iconize}}
-
-Iconizes or restores the frame.
+Creates a toolbar at the top or left of the frame.
 
 \wxheading{Parameters}
 
-\docparam{izonize}{If TRUE, iconizes the frame; if FALSE, shows and restores it.}
-
-\wxheading{See also}
-
-\helpref{wxFrame::IsIconized}{wxframeisiconized}, \helpref{wxFrame::Maximize}{wxframemaximize}.
+\docparam{style}{The toolbar style. See \helpref{wxToolBar}{wxtoolbar} for a list
+of valid styles.}
 
-\membersection{wxFrame::IsIconized}\label{wxframeisiconized}
+\docparam{id}{The toolbar window identifier. If -1, an identifier will be chosen by
+wxWidgets.}
 
-\func{bool}{IsIconized}{\void}
+\docparam{name}{The toolbar window name.}
 
-Returns TRUE if the frame is iconized.
+\wxheading{Return value}
 
-\membersection{wxFrame::LoadAccelerators}\label{wxframeloadaccelerators}
+A pointer to the toolbar if it was created successfully, NULL otherwise.
 
-\func{void}{LoadAccelerators}{\param{const wxString\& }{table}}
+\wxheading{Remarks}
 
-Loads a keyboard accelerator table for this frame.
+By default, the toolbar is an instance of wxToolBar (which is defined to be
+a suitable toolbar class on each platform, such as wxToolBar95). To use a different class,
+override \helpref{wxFrame::OnCreateToolBar}{wxframeoncreatetoolbar}.
 
-\wxheading{Parameters}
+When a toolbar has been created with this function, or made known to the frame
+with \helpref{wxFrame::SetToolBar}{wxframesettoolbar}, the frame will manage the toolbar
+position and adjust the return value from \helpref{wxWindow::GetClientSize}{wxwindowgetclientsize} to
+reflect the available space for application windows.
 
-\docparam{table}{Accelerator table to load.}
+Under Pocket PC, you should {\it always} use this function for creating the toolbar
+to be managed by the frame, so that wxWidgets can use a combined
+menubar and toolbar. Where you manage your own toolbars, create a wxToolBar
+as usual.
 
-\wxheading{Return value}
+\wxheading{See also}
 
-TRUE if the operation was successful, FALSE otherwise.
+\helpref{wxFrame::CreateStatusBar}{wxframecreatestatusbar},\rtfsp
+\helpref{wxFrame::OnCreateToolBar}{wxframeoncreatetoolbar},\rtfsp
+\helpref{wxFrame::SetToolBar}{wxframesettoolbar},\rtfsp
+\helpref{wxFrame::GetToolBar}{wxframegettoolbar}
 
-\wxheading{Remarks}
+\membersection{wxFrame::GetClientAreaOrigin}\label{wxframegetclientareaorigin}
 
-Accelerator tables map keystrokes onto control and menu identifiers, so the
-programmer does not have to explicitly program this correspondence.
+\constfunc{wxPoint}{GetClientAreaOrigin}{\void}
 
-See the hello demo ({\tt hello.cpp} and {\tt hello.rc}) for
-an example of accelerator usage. This is a fragment from {\tt hello.rc}:
+Returns the origin of the frame client area (in client coordinates). It may be
+different from (0, 0) if the frame has a toolbar.
 
-\begin{verbatim}
-#define HELLO_LOAD_FILE  111
+\membersection{wxFrame::GetMenuBar}\label{wxframegetmenubar}
 
-menus_accel ACCELERATORS
-{
+\constfunc{wxMenuBar*}{GetMenuBar}{\void}
 
-"^L", HELLO_LOAD_FILE
+Returns a pointer to the menubar currently associated with the frame (if any).
 
-}
-\end{verbatim}
+\wxheading{See also}
 
-This function only works under Windows.
+\helpref{wxFrame::SetMenuBar}{wxframesetmenubar}, \helpref{wxMenuBar}{wxmenubar}, \helpref{wxMenu}{wxmenu}
 
-% huh? If you call LoadAccelerators, you need to override wxFrame::OnActivate to do nothing.
+\membersection{wxFrame::GetStatusBar}\label{wxframegetstatusbar}
 
-\membersection{wxFrame::Maximize}\label{wxframemaximize}
+\constfunc{wxStatusBar*}{GetStatusBar}{\void}
 
-\func{void}{Maximize}{\param{const bool }{maximize}}
+Returns a pointer to the status bar currently associated with the frame (if any).
 
-Maximizes or restores the frame.
+\wxheading{See also}
 
-\wxheading{Parameters}
+\helpref{wxFrame::CreateStatusBar}{wxframecreatestatusbar}, \helpref{wxStatusBar}{wxstatusbar}
 
-\docparam{maximize}{If TRUE, maximizes the frame, otherwise it restores it}.
+\membersection{wxFrame::GetStatusBarPane}\label{wxframegetstatusbarpane}
 
-\wxheading{Remarks}
+\func{int}{GetStatusBarPane}{\void}
 
-This function only works under Windows.
+Returns the status bar pane used to display menu and toolbar help.
 
 \wxheading{See also}
 
-\helpref{wxFrame::Iconize}{wxframeiconize}
+\helpref{wxFrame::SetStatusBarPane}{wxframesetstatusbarpane}
 
-\membersection{wxFrame::OnActivate}
+\membersection{wxFrame::GetToolBar}\label{wxframegettoolbar}
 
-\func{void}{OnActivate}{\param{bool}{ active}}
+\constfunc{wxToolBar*}{GetToolBar}{\void}
 
-Called when a window is activated or deactivated (MS Windows
-only). If the window is being activated, {\it active} is TRUE, else it
-is FALSE.
+Returns a pointer to the toolbar currently associated with the frame (if any).
 
-If you call wxFrame::LoadAccelerators, you need to override this function e.g.
+\wxheading{See also}
 
-\begin{verbatim}
-   void OnActivate(bool) {};
-\end{verbatim}
+\helpref{wxFrame::CreateToolBar}{wxframecreatetoolbar}, \helpref{wxToolBar}{wxtoolbar},\rtfsp
+\helpref{wxFrame::SetToolBar}{wxframesettoolbar}
 
 \membersection{wxFrame::OnCreateStatusBar}\label{wxframeoncreatestatusbar}
 
-\func{virtual wxStatusBar*}{OnCreateStatusBar}{\param{int }{number}}
+\func{virtual wxStatusBar*}{OnCreateStatusBar}{\param{int }{number},
+ \param{long}{ style},
+ \param{wxWindowID}{ id}, \param{const wxString\&}{ name}}
 
 Virtual function called when a status bar is requested by \helpref{wxFrame::CreateStatusBar}{wxframecreatestatusbar}.
 
@@ -277,6 +313,14 @@ Virtual function called when a status bar is requested by \helpref{wxFrame::Crea
 
 \docparam{number}{The number of fields to create.}
 
+\docparam{style}{The window style. See \helpref{wxStatusBar}{wxstatusbar} for a list
+of valid styles.}
+
+\docparam{id}{The window identifier. If -1, an identifier will be chosen by
+wxWidgets.}
+
+\docparam{name}{The window name.}
+
 \wxheading{Return value}
 
 A status bar object.
@@ -290,77 +334,87 @@ implementation returns an instance of \helpref{wxStatusBar}{wxstatusbar}.
 
 \helpref{wxFrame::CreateStatusBar}{wxframecreatestatusbar}, \helpref{wxStatusBar}{wxstatusbar}.
 
-\membersection{wxFrame::OnMenuCommand}\label{wxframeonmenucommand}
-
-\func{void}{OnMenuCommand}{\param{wxCommandEvent\&}{ event}}
-
-See \helpref{wxWindow::OnMenuCommand}{wxwindowonmenucommand}.
+\membersection{wxFrame::OnCreateToolBar}\label{wxframeoncreatetoolbar}
 
-\membersection{wxFrame::OnMenuHighlight}\label{wxframeonmenuhighlight}
+\func{virtual wxToolBar*}{OnCreateToolBar}{\param{long}{ style},
+ \param{wxWindowID}{ id}, \param{const wxString\&}{ name}}
 
-\func{void}{OnMenuHighlight}{\param{wxMenuEvent\&}{ event}}
+Virtual function called when a toolbar is requested by \helpref{wxFrame::CreateToolBar}{wxframecreatetoolbar}.
 
-See \helpref{wxWindow::OnMenuHighlight}{wxwindowonmenuhighlight}.
-
-\membersection{wxFrame::OnSize}\label{wxframeonsize}
-
-\func{void}{OnSize}{\param{wxSizeEvent\& }{event}}
+\wxheading{Parameters}
 
-See \helpref{wxWindow::OnSize}{wxwindowonsize}.
+\docparam{style}{The toolbar style. See \helpref{wxToolBar}{wxtoolbar} for a list
+of valid styles.}
 
-The default {\bf wxFrame::OnSize} implementation looks for a single subwindow,
-and if one is found, resizes it to fit
-inside the frame. Override this member if more complex behaviour
-is required (for example, if there are several subwindows).
+\docparam{id}{The toolbar window identifier. If -1, an identifier will be chosen by
+wxWidgets.}
 
-\membersection{wxFrame::SetIcon}\label{wxframeseticon}
+\docparam{name}{The toolbar window name.}
 
-\func{void}{SetIcon}{\param{const wxIcon\& }{icon}}
+\wxheading{Return value}
 
-Sets the icon for this frame.
+A toolbar object.
 
-\wxheading{Parameters}
+\wxheading{Remarks}
 
-\docparam{icon}{The icon to associate with this frame.}
+An application can override this function to return a different kind of toolbar. The default
+implementation returns an instance of \helpref{wxToolBar}{wxtoolbar}.
 
-\wxheading{Remarks}
+\wxheading{See also}
 
-The frame takes a `copy' of {\it icon}, but since it uses reference
-counting, the copy is very quick. It is safe to delete {\it icon} after
-calling this function.
+\helpref{wxFrame::CreateToolBar}{wxframecreatetoolbar}, \helpref{wxToolBar}{wxtoolbar}.
 
-Under Windows, instead of using {\bf SetIcon}, you can add the
-following lines to your MS Windows resource file:
 
-\begin{verbatim}
-wxSTD_MDIPARENTFRAME ICON icon1.ico
-wxSTD_MDICHILDFRAME  ICON icon2.ico
-wxSTD_FRAME          ICON icon3.ico
-\end{verbatim}
+\membersection{wxFrame::ProcessCommand}\label{wxframeprocesscommand}
 
-where icon1.ico will be used for the MDI parent frame, icon2.ico
-will be used for MDI child frames, and icon3.ico will be used for
-non-MDI frames.
+\func{void}{ProcessCommand}{\param{int }{id}}
 
-If these icons are not supplied, and {\bf SetIcon} is not called either,
-then the following defaults apply if you have included wx.rc.
+Simulate a menu command.
 
-\begin{verbatim}
-wxDEFAULT_FRAME               ICON std.ico
-wxDEFAULT_MDIPARENTFRAME      ICON mdi.ico
-wxDEFAULT_MDICHILDFRAME       ICON child.ico
-\end{verbatim}
+\wxheading{Parameters}
 
-You can replace std.ico, mdi.ico and child.ico with your own defaults
-for all your wxWindows application. Currently they show the same icon.
+\docparam{id}{The identifier for a menu item.}
 
-{\it Note:} a wxWindows application linked with subsystem equal to 4.0
-(i.e. marked as a Windows 95 application) doesn't respond properly
-to wxFrame::SetIcon. To work around this until a solution is found,
-mark your program as a 3.5 application. This will also ensure
-that Windows provides small icons for the application automatically.
 
-See also \helpref{wxIcon}{wxicon}.
+\membersection{wxFrame::SendSizeEvent}\label{wxframesendsizeevent}
+
+\func{void}{SendSizeEvent}{\void}
+
+This function sends a dummy \helpref{size event}{wxsizeevent} to the frame
+forcing it to reevaluate its children positions. It is sometimes useful to call
+this function after adding or deleting a children after the frame creation or
+if a child size changes.
+
+Note that if the frame is using either sizers or constraints for the children
+layout, it is enough to call \helpref{Layout()}{wxwindowlayout} directly and
+this function should not be used in this case.
+
+% VZ: we don't have all this any more (18.08.00)
+%
+%Under Windows, instead of using {\bf SetIcon}, you can add the
+%following lines to your MS Windows resource file:
+%
+%\begin{verbatim}
+%wxSTD_MDIPARENTFRAME ICON icon1.ico
+%wxSTD_MDICHILDFRAME  ICON icon2.ico
+%wxSTD_FRAME          ICON icon3.ico
+%\end{verbatim}
+%
+%where icon1.ico will be used for the MDI parent frame, icon2.ico
+%will be used for MDI child frames, and icon3.ico will be used for
+%non-MDI frames.
+%
+%If these icons are not supplied, and {\bf SetIcon} is not called either,
+%then the following defaults apply if you have included wx.rc.
+%
+%\begin{verbatim}
+%wxDEFAULT_FRAME               ICON std.ico
+%wxDEFAULT_MDIPARENTFRAME      ICON mdi.ico
+%wxDEFAULT_MDICHILDFRAME       ICON child.ico
+%\end{verbatim}
+%
+%You can replace std.ico, mdi.ico and child.ico with your own defaults
+%for all your wxWidgets application. Currently they show the same icon.
 
 \membersection{wxFrame::SetMenuBar}\label{wxframesetmenubar}
 
@@ -379,15 +433,33 @@ menu bar and its menus will be destroyed also, so do not delete the menu
 bar explicitly (except by resetting the frame's menu bar to another
 frame or NULL).
 
-Under Windows, a call to \helpref{wxFrame::OnSize}{wxframeonsize} is generated, so be sure to initialize
+Under Windows, a size event is generated, so be sure to initialize
 data members properly before calling {\bf SetMenuBar}.
 
-Note that it is not possible to call this function twice for the same frame object.
+Note that on some platforms, it is not possible to call this function twice for the same frame object.
 
 \wxheading{See also}
 
 \helpref{wxFrame::GetMenuBar}{wxframegetmenubar}, \helpref{wxMenuBar}{wxmenubar}, \helpref{wxMenu}{wxmenu}.
 
+\membersection{wxFrame::SetStatusBar}\label{wxframesetstatusbar}
+
+\func{void}{SetStatusBar}{\param{wxStatusBar*}{ statusBar}}
+
+Associates a status bar with the frame.
+
+\wxheading{See also}
+
+\helpref{wxFrame::CreateStatusBar}{wxframecreatestatusbar}, \helpref{wxStatusBar}{wxstatusbar},\rtfsp
+\helpref{wxFrame::GetStatusBar}{wxframegetstatusbar}
+
+\membersection{wxFrame::SetStatusBarPane}\label{wxframesetstatusbarpane}
+
+\func{void}{SetStatusBarPane}{\param{int}{ n}}
+
+Set the status bar pane used to display menu and toolbar help.
+Using -1 disables help display.
+
 \membersection{wxFrame::SetStatusText}\label{wxframesetstatustext}
 
 \func{virtual void}{SetStatusText}{\param{const wxString\& }{ text}, \param{int}{ number = 0}}
@@ -416,7 +488,7 @@ Sets the widths of the fields in the status bar.
 
 \wxheading{Parameters}
 
-\wxheading{n}{The number of fields in the status bar. It must be the
+\docparam{n}{The number of fields in the status bar. It must be the
 same used in \helpref{CreateStatusBar}{wxframecreatestatusbar}.}
 
 \docparam{widths}{Must contain an array of {\it n} integers, each of which is a status field width
@@ -426,20 +498,22 @@ field must be -1. You should delete this array after calling {\bf SetStatusWidth
 \wxheading{Remarks}
 
 The widths of the variable fields are calculated from the total width of all fields,
-minus the sum of widths of the non-variable fields, divided by the number of 
+minus the sum of widths of the non-variable fields, divided by the number of
 variable fields.
 
-\membersection{wxFrame::SetTitle}\label{wxframesettitle}
+\pythonnote{Only a single parameter is required, a Python list of
+integers.}
 
-\func{virtual void}{SetTitle}{\param{const wxString\& }{ title}}
+\perlnote{In wxPerl this method takes the field widths as parameters.}
 
-Sets the frame title.
+\membersection{wxFrame::SetToolBar}\label{wxframesettoolbar}
 
-\wxheading{Parameters}
+\func{void}{SetToolBar}{\param{wxToolBar*}{ toolBar}}
 
-\docparam{title}{The frame title.}
+Associates a toolbar with the frame.
 
 \wxheading{See also}
 
-\helpref{wxFrame::GetTitle}{wxframegettitle}
+\helpref{wxFrame::CreateToolBar}{wxframecreatetoolbar}, \helpref{wxToolBar}{wxtoolbar},\rtfsp
+\helpref{wxFrame::GetToolBar}{wxframegettoolbar}
 
