X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/ea76a6a5ca75f8e623982de97f7f7b2746b5ee50..fb4888a650065c9a24572d6867345f34adafaa37:/docs/latex/wx/dc.tex?ds=sidebyside

diff --git a/docs/latex/wx/dc.tex b/docs/latex/wx/dc.tex
index c2f28ef4b0..7a2a77b2a3 100644
--- a/docs/latex/wx/dc.tex
+++ b/docs/latex/wx/dc.tex
@@ -193,6 +193,15 @@ wxUSE\_DC\_CACHEING preprocessor symbol for portability.
 \end{comment}
 
 
+\membersection{wxDC::ComputeScaleAndOrigin}\label{wxdccomputescaleandorigin}
+
+\func{virtual void}{ComputeScaleAndOrigin}{\void}
+
+Performs all necessary computations for given platform and context type
+after each change of scale and origin parameters. Usually called automatically 
+internally after such changes.
+
+
 \membersection{wxDC::CrossHair}\label{wxdccrosshair}
 
 \func{void}{CrossHair}{\param{wxCoord}{ x}, \param{wxCoord}{ y}}
@@ -495,12 +504,15 @@ the rectangle.
 
 \membersection{wxDC::DrawSpline}\label{wxdcdrawspline}
 
+\func{void}{DrawSpline}{\param{int }{n}, \param{wxPoint }{points[]}}
+
+Draws a spline between all given control points, using the current
+pen.
+
 \func{void}{DrawSpline}{\param{wxList *}{points}}
 
 Draws a spline between all given control points, using the current
-pen.  Doesn't delete the wxList and contents. The spline is drawn
-using a series of lines, using an algorithm taken from the X drawing
-program `XFIG'.
+pen.  Doesn't delete the wxList and contents.
 
 \func{void}{DrawSpline}{\param{wxCoord}{ x1}, \param{wxCoord}{ y1}, \param{wxCoord}{ x2}, \param{wxCoord}{ y2}, \param{wxCoord}{ x3}, \param{wxCoord}{ y3}}
 
@@ -895,8 +907,8 @@ doesn't contain anything.
                                 \param{bool}{ yBottomUp}}
 
 Sets the x and y axis orientation (i.e., the direction from lowest to
-highest values on the axis). The default orientation is the natural
-orientation, e.g. x axis from left to right and y axis from bottom up.
+highest values on the axis). The default orientation is 
+x axis from left to right and y axis from top down.
 
 \wxheading{Parameters}
 
@@ -1106,7 +1118,7 @@ Sets the user scaling factor, useful for applications which require
 \func{bool}{StartDoc}{\param{const wxString\& }{message}}
 
 Starts a document (only relevant when outputting to a printer).
-Message is a message to show whilst printing.
+Message is a message to show while printing.
 
 
 \membersection{wxDC::StartPage}\label{wxdcstartpage}
@@ -1117,9 +1129,9 @@ Starts a document page (only relevant when outputting to a printer).
 
 \section{\class{wxDCClipper}}\label{wxdcclipper}
 
-This is a small helper class which sets the specified to its constructor
+This is a small helper class which sets the specified DC to its constructor
 clipping region and then automatically destroys it in its destructor. Using
-it ensures that unwanted clipping region is not left set on the DC.
+it ensures that an unwanted clipping region is not left set on the DC.
 
 \wxheading{Derived from}
 
