X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/ea44a6310ed57464258c6337dcc749197338c79f..8d99dec09b29b5bce370b087cc0f35e2be9cb39a:/docs/latex/wx/tlog.tex

diff --git a/docs/latex/wx/tlog.tex b/docs/latex/wx/tlog.tex
index 69e642f69a..2b2fab3e84 100644
--- a/docs/latex/wx/tlog.tex
+++ b/docs/latex/wx/tlog.tex
@@ -26,8 +26,9 @@ arguments or a variable argument list pointer. Here are all of them:
 
 \begin{itemize}\itemsep=0pt
 \item{\bf wxLogFatalError} which is like {\it wxLogError}, but also
-terminates the program with the exit code 3 (using {\it abort()} standard
-function also terminates the program with this exit code).
+terminates the program with the exit code $3$ (using {\it abort()} standard
+function). Unlike for all the other logging functions, this function can't be
+overridden by a log target.
 \item{\bf wxLogError} is the function to use for error messages, i.e. the
 messages that must be shown to the user. The default processing is to pop up a
 message box to inform the user about it.
