X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/e9f4f51d06f536fadacb1796fa124728f50674d2..b253fb5cea219d563583fa8c26e71473f1c5c946:/docs/latex/wx/stdevtid.tex

diff --git a/docs/latex/wx/stdevtid.tex b/docs/latex/wx/stdevtid.tex
index 48ff1da816..bb2c7700e9 100644
--- a/docs/latex/wx/stdevtid.tex
+++ b/docs/latex/wx/stdevtid.tex
@@ -12,6 +12,9 @@ you may use it to indicate that you want to handle the events
 coming from any control, regardless of its identifier
 \end{itemize}
 
+Another standard special identifier value is {\tt wxID\_NONE}: this is a value
+which is not matched by any other id.
+
 wxWidgets also defines a few standard command identifiers which may be used by
 the user code and also are sometimes used by wxWidgets itself. These reserved
 identifiers are all in the range between {\tt wxID\_LOWEST} and 
@@ -36,6 +39,8 @@ own constants in this range.
     wxID_PREVIEW,
     wxID_ABOUT,
     wxID_HELP_CONTENTS,
+    wxID_HELP_INDEX,
+    wxID_HELP_SEARCH,
     wxID_HELP_COMMANDS,
     wxID_HELP_PROCEDURES,
     wxID_HELP_CONTEXT,
