X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/e9f4f51d06f536fadacb1796fa124728f50674d2..3d3f3e3749fa5812c1937736b8745d696263a8b5:/docs/latex/wx/stdevtid.tex?ds=sidebyside

diff --git a/docs/latex/wx/stdevtid.tex b/docs/latex/wx/stdevtid.tex
index 48ff1da816..cfe2af1d19 100644
--- a/docs/latex/wx/stdevtid.tex
+++ b/docs/latex/wx/stdevtid.tex
@@ -12,6 +12,9 @@ you may use it to indicate that you want to handle the events
 coming from any control, regardless of its identifier
 \end{itemize}
 
+Another standard special identifier value is {\tt wxID\_NONE}: this is a value
+which is not matched by any other id.
+
 wxWidgets also defines a few standard command identifiers which may be used by
 the user code and also are sometimes used by wxWidgets itself. These reserved
 identifiers are all in the range between {\tt wxID\_LOWEST} and 
