X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/e9793aef3c7b27ccd65a7b3353464d7a3681c52c..daf5b37afdda9e8ab7f909e01ffd6387219a80ea:/docs/latex/wx/glcontext.tex?ds=inline

diff --git a/docs/latex/wx/glcontext.tex b/docs/latex/wx/glcontext.tex
index 3a2db6fa03..057977aad2 100644
--- a/docs/latex/wx/glcontext.tex
+++ b/docs/latex/wx/glcontext.tex
@@ -15,6 +15,10 @@ was initialized. (This applies to sharing display lists among contexts analogous
 
 Note that some wxGLContext features are extremely platform-specific - its best to check your native platform's glcanvas header (on windows include/wx/msw/glcanvas.h) to see what features your native platform provides.
 
+\wxheading{Library}
+
+\helpref{wxGl}{librarieslist}
+
 \wxheading{Derived from}
 
 \helpref{wxObject}{wxobject}
@@ -52,5 +56,5 @@ with equivalent attributes as {\it win}.}
 Makes the OpenGL state that is represented by this rendering context current with the wxGLCanvas {\it win}.
 Note that {\it win} can be a different wxGLCanvas window than the one that was passed to the constructor of this rendering context.
 If { \it RC } is an object of type wxGLContext, the statements {\it RC.SetCurrent(win);} and {\it win.SetCurrent(RC);} are equivalent,
-see \helpref{wxGLCanvas::SetCurrent}{wxglcanvassetcurrentrc}.
+see \helpref{wxGLCanvas::SetCurrent}{wxglcanvassetcurrent}.
 
