X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/e8800dcfa76ba8ff79c2d171dc5d45028dca4574..c2651b0a5c407ceb1693a865ee19d3d57e147c97:/docs/latex/wx/flexsizr.tex

diff --git a/docs/latex/wx/flexsizr.tex b/docs/latex/wx/flexsizr.tex
index 92c1f8d5c2..c161b8fafa 100644
--- a/docs/latex/wx/flexsizr.tex
+++ b/docs/latex/wx/flexsizr.tex
@@ -6,7 +6,7 @@ height and all fields in one column having the same width, but all
 rows or all columns are not necessarily the same height or width as in
 the \helpref{wxGridSizer}{wxgridsizer}.
 
-Since wxWindows 2.5.0, wxFlexGridSizer can also size items equally in one
+Since wxWidgets 2.5.0, wxFlexGridSizer can also size items equally in one
 direction but unequally ("flexibly") in the other. If the sizer is only
 flexible in one direction (this can be changed using 
 \helpref{SetFlexibleDrection}{wxflexgridsizersetflexibledirection}),
@@ -21,10 +21,15 @@ serves this purpose.
 \helpref{wxSizer}{wxsizer}\\
 \helpref{wxObject}{wxobject}
 
+\wxheading{Include files}
+
+<wx/sizer.h>
+
 \wxheading{See also}
 
 \helpref{wxSizer}{wxsizer}, \helpref{Sizer overview}{sizeroverview}
 
+\latexignore{\rtfignore{\wxheading{Members}}}
 
 \membersection{wxFlexGridSizer::wxFlexGridSizer}\label{wxflexgridsizerwxflexgridsizer}
 
@@ -101,7 +106,7 @@ One of the following values:
 In this case equal sizing applies to minimum sizes of columns or
 rows (this is the default value).}
 \twocolitem{wxFLEX\_GROWMODE\_ALL}{Sizer equally stretches all columns or rows
-in the non flexible direction, whether they are growable or not in the flexbile
+in the non flexible direction, whether they are growable or not in the flexible
 direction.}
 \end{twocollist}
 
@@ -140,7 +145,7 @@ Note that this method does not trigger relayout.
 
 \membersection{wxFlexGridSizer::SetNonFlexibleGrowMode}\label{wxflexgridsizersetnonflexiblegrowmode}
 
-\func{void}{SetNonFlexibleGrowMode}{\param{int }{mode}}
+\func{void}{SetNonFlexibleGrowMode}{\param{wxFlexSizerGrowMode }{mode}}
 
 Specifies how the sizer should grow in the non flexible direction if
 there is one (so
