X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/e8800dcfa76ba8ff79c2d171dc5d45028dca4574..7ad56d275d114ab3f2d34c9dcc56b7012c4829e9:/docs/latex/wx/flexsizr.tex

diff --git a/docs/latex/wx/flexsizr.tex b/docs/latex/wx/flexsizr.tex
index 92c1f8d5c2..be71c5c326 100644
--- a/docs/latex/wx/flexsizr.tex
+++ b/docs/latex/wx/flexsizr.tex
@@ -6,7 +6,7 @@ height and all fields in one column having the same width, but all
 rows or all columns are not necessarily the same height or width as in
 the \helpref{wxGridSizer}{wxgridsizer}.
 
-Since wxWindows 2.5.0, wxFlexGridSizer can also size items equally in one
+Since wxWidgets 2.5.0, wxFlexGridSizer can also size items equally in one
 direction but unequally ("flexibly") in the other. If the sizer is only
 flexible in one direction (this can be changed using 
 \helpref{SetFlexibleDrection}{wxflexgridsizersetflexibledirection}),
@@ -21,6 +21,10 @@ serves this purpose.
 \helpref{wxSizer}{wxsizer}\\
 \helpref{wxObject}{wxobject}
 
+\wxheading{Include files}
+
+<wx/sizer.h>
+
 \wxheading{See also}
 
 \helpref{wxSizer}{wxsizer}, \helpref{Sizer overview}{sizeroverview}
@@ -140,7 +144,7 @@ Note that this method does not trigger relayout.
 
 \membersection{wxFlexGridSizer::SetNonFlexibleGrowMode}\label{wxflexgridsizersetnonflexiblegrowmode}
 
-\func{void}{SetNonFlexibleGrowMode}{\param{int }{mode}}
+\func{void}{SetNonFlexibleGrowMode}{\param{wxFlexSizerGrowMode }{mode}}
 
 Specifies how the sizer should grow in the non flexible direction if
 there is one (so
