X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/e8800dcfa76ba8ff79c2d171dc5d45028dca4574..2006289b741f13c3d0a89f3758777850135f10e1:/docs/latex/wx/flexsizr.tex

diff --git a/docs/latex/wx/flexsizr.tex b/docs/latex/wx/flexsizr.tex
index 92c1f8d5c2..8de85ab2a8 100644
--- a/docs/latex/wx/flexsizr.tex
+++ b/docs/latex/wx/flexsizr.tex
@@ -6,7 +6,7 @@ height and all fields in one column having the same width, but all
 rows or all columns are not necessarily the same height or width as in
 the \helpref{wxGridSizer}{wxgridsizer}.
 
-Since wxWindows 2.5.0, wxFlexGridSizer can also size items equally in one
+Since wxWidgets 2.5.0, wxFlexGridSizer can also size items equally in one
 direction but unequally ("flexibly") in the other. If the sizer is only
 flexible in one direction (this can be changed using 
 \helpref{SetFlexibleDrection}{wxflexgridsizersetflexibledirection}),
@@ -21,6 +21,10 @@ serves this purpose.
 \helpref{wxSizer}{wxsizer}\\
 \helpref{wxObject}{wxobject}
 
+\wxheading{Include files}
+
+<wx/sizer.h>
+
 \wxheading{See also}
 
 \helpref{wxSizer}{wxsizer}, \helpref{Sizer overview}{sizeroverview}
