X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/e8482f24cfc00645607f8526fde38d39e0dcaa63..a2615ebc22a402b1badb46475f94ab6aa3a64018:/contrib/docs/latex/mmedia/bugs.tex

diff --git a/contrib/docs/latex/mmedia/bugs.tex b/contrib/docs/latex/mmedia/bugs.tex
index d66f64e613..a89dff9828 100644
--- a/contrib/docs/latex/mmedia/bugs.tex
+++ b/contrib/docs/latex/mmedia/bugs.tex
@@ -5,7 +5,5 @@
 These are the known bugs.
 
 \begin{itemize}\itemsep=0pt
-\item In the OGLEdit sample, .dia files are output double-spaced
-due to an unidentified bug in the way a stream is converted to a file.
+\item No bugs
 \end{itemize}
-
