X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/e72403492b3e78f8114d89baae6f81ea24c74647..a9249b2eb2a40d8c71f828669045c4ddaa8dc5ff:/docs/latex/wx/inputstr.tex

diff --git a/docs/latex/wx/inputstr.tex b/docs/latex/wx/inputstr.tex
index d44190c0e4..e830886624 100644
--- a/docs/latex/wx/inputstr.tex
+++ b/docs/latex/wx/inputstr.tex
@@ -91,7 +91,7 @@ Changes the stream current position.
 
 Returns the current stream position.
 
-\membersection{wxInputStream::Ungetch}\label{wxinputstream\_ungetch}
+\membersection{wxInputStream::Ungetch}\label{wxinputstreamungetch}
 
 \func{size\_t}{Ungetch}{\param{const char*}{ buffer}, \param{size\_t}{ size}}
 
