X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/e72403492b3e78f8114d89baae6f81ea24c74647..53663be8a5ea8e1c6f178839209b67e8228e4642:/docs/latex/wx/inputstr.tex

diff --git a/docs/latex/wx/inputstr.tex b/docs/latex/wx/inputstr.tex
index d44190c0e4..a46d41fa39 100644
--- a/docs/latex/wx/inputstr.tex
+++ b/docs/latex/wx/inputstr.tex
@@ -40,7 +40,7 @@ Returns the first character in the input queue and removes it.
 
 \constfunc{wxInputStream}{Eof}{\void}
 
-Returns TRUE if the end of stream has been reached.
+Returns true if the end of stream has been reached.
 
 \membersection{wxInputStream::LastRead}\label{wxinputstreamlastread}
 
@@ -91,12 +91,12 @@ Changes the stream current position.
 
 Returns the current stream position.
 
-\membersection{wxInputStream::Ungetch}\label{wxinputstream\_ungetch}
+\membersection{wxInputStream::Ungetch}\label{wxinputstreamungetch}
 
 \func{size\_t}{Ungetch}{\param{const char*}{ buffer}, \param{size\_t}{ size}}
 
 This function is only useful in {\it read} mode. It is the manager of the "Write-Back"
-buffer. This buffer acts like a temporary buffer where datas which has to be
+buffer. This buffer acts like a temporary buffer where data which has to be
 read during the next read IO call are put. This is useful when you get a big
 block of data which you didn't want to read: you can replace them at the top
 of the input queue by this way.
