X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/e7102772826e7034ae89536dcd018039526293d1..db67d86dd1de506a5bb14dd59e9c45230120758a:/docs/latex/wx/keyevent.tex

diff --git a/docs/latex/wx/keyevent.tex b/docs/latex/wx/keyevent.tex
index 01a3ac89f2..eff2b8c547 100644
--- a/docs/latex/wx/keyevent.tex
+++ b/docs/latex/wx/keyevent.tex
@@ -28,7 +28,7 @@ as well.
 Although in this simple case it is clear that the correct key code could be
 found in the key down event handler by checking the value returned by
 \helpref{ShiftDown()}{wxkeyeventshiftdown}, in general you should use
-{\tt EVT\_CHAR} for this as for non alphanumeric keys the translation is
+{\tt EVT\_CHAR} for this as for non-alphanumeric keys the translation is
 keyboard-layout dependent and can only be done properly by the system itself.
 
 Another kind of translation is done when the control key is pressed: for
