X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/e6ef9ea4ed13bee3ea5d830270986eab571876e6..85136e3bf5dadf921652519e71da5db351fb3194:/docs/latex/wx/function.tex

diff --git a/docs/latex/wx/function.tex b/docs/latex/wx/function.tex
index f3e5b28410..f8c78e68aa 100644
--- a/docs/latex/wx/function.tex
+++ b/docs/latex/wx/function.tex
@@ -169,6 +169,7 @@ the corresponding topic.
 \helpref{wxGetenv}{wxgetenvmacro}\\
 \helpref{wxHandleFatalExceptions}{wxhandlefatalexceptions}\\
 \helpref{wxICON}{wxiconmacro}\\
+\helpref{wxInfoMessageBox}{wxinfomessagebox}\\
 \helpref{wxINTXX\_SWAP\_ALWAYS}{intswapalways}\\
 \helpref{wxINTXX\_SWAP\_ON\_BE}{intswaponbe}\\
 \helpref{wxINTXX\_SWAP\_ON\_LE}{intswaponle}\\
@@ -2355,6 +2356,23 @@ and {\tt choices}, and the client data array must have the
 same length as the choices array.}
 
 
+\membersection{::wxInfoMessageBox}\label{wxinfomessagebox}
+
+\func{void}{wxInfoMessageBox}{\param{wxWindow (}{parent = \NULL}}
+
+Shows a message box with the information about the wxWidgets build used,
+including its version, most important build parameters and the version of the
+underlying GUI toolkit. This is mainly used for diagnostic purposes and can be
+invoked by Ctrl-Alt-middle clicking on any wxWindow which doesn't otherwise
+handle this event.
+
+\newsince{2.9.0}
+
+\wxheading{Include files}
+
+<wx/utils.h>
+
+
 \membersection{::wxIsBusy}\label{wxisbusy}
 
 \func{bool}{wxIsBusy}{\void}
