X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/e69d5138dc8f95e294ae6d03beb4f321406f4e34..62a268cc71a93c9fd2d696bc85b323e232f44a20:/docs/latex/wx/window.tex?ds=sidebyside

diff --git a/docs/latex/wx/window.tex b/docs/latex/wx/window.tex
index 0d199dedd7..65ecd4b2a5 100644
--- a/docs/latex/wx/window.tex
+++ b/docs/latex/wx/window.tex
@@ -3692,3 +3692,4 @@ Interface Guidelines forbid moving the mouse cursor programmatically.
 \docparam{x}{The new x position for the cursor.}
 
 \docparam{y}{The new y position for the cursor.}
+
