X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/e6994168fec352da51e8ccf1fcb41ca996df0297..94cf5fc7230759904c7fe2e616383f64ea4da02d:/docs/latex/wx/sizer.tex?ds=inline

diff --git a/docs/latex/wx/sizer.tex b/docs/latex/wx/sizer.tex
index c871edc5a9..a0c77ab757 100644
--- a/docs/latex/wx/sizer.tex
+++ b/docs/latex/wx/sizer.tex
@@ -384,7 +384,7 @@ by the sizer to resize themselves according to the rules defined by the paramete
 
 \func{void}{SetMinSize}{\param{int }{width}, \param{int }{height}}
 
-\func{void}{SetMinSize}{\param{wxSize }{size}}
+\func{void}{SetMinSize}{\param{const wxSize\& }{size}}
 
 Call this to give the sizer a minimal size. Normally, the sizer will calculate its
 minimal size based purely on how much space its children need. After calling this
