X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/e676441ff41b4d80cc1587691a359165b518fbc4..156194e1d525407e90c21552f8f7aa05756e0ddc:/docs/latex/wx/radiobox.tex

diff --git a/docs/latex/wx/radiobox.tex b/docs/latex/wx/radiobox.tex
index f1e9a81d00..7aaf5c0bd7 100644
--- a/docs/latex/wx/radiobox.tex
+++ b/docs/latex/wx/radiobox.tex
@@ -113,17 +113,17 @@ for further details.
 
 \membersection{wxRadioBox::Enable}\label{wxradioboxenable}
 
-\func{void}{Enable}{\param{const bool}{ enable}}
+\func{void}{Enable}{\param{bool}{ enable = {\tt true}}}
 
 Enables or disables the entire radiobox.
 
-\func{void}{Enable}{\param{int}{ n}, \param{const bool}{ enable}}
+\func{void}{Enable}{\param{int}{ n}, \param{bool}{ enable = {\tt true}}}
 
 Enables or disables an individual button in the radiobox.
 
 \wxheading{Parameters}
 
-\docparam{enable}{TRUE to enable, FALSE to disable.}
+\docparam{enable}{true to enable, false to disable.}
 
 \docparam{n}{The zero-based button to enable or disable.}
 
@@ -263,7 +263,7 @@ Shows or hides individual buttons.
 
 \wxheading{Parameters}
 
-\docparam{show}{TRUE to show, FALSE to hide.}
+\docparam{show}{true to show, false to hide.}
 
 \docparam{item}{The zero-based position of the button to show or hide.}
 
