X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/e5d1e06de3949d39111f0d6b2eef69cd30d6885b..b19add95cdee6f8c2d48215a70662bd15a698243:/docs/latex/wx/image.tex?ds=sidebyside

diff --git a/docs/latex/wx/image.tex b/docs/latex/wx/image.tex
index 6204e9fd6b..8f6ecf94c6 100644
--- a/docs/latex/wx/image.tex
+++ b/docs/latex/wx/image.tex
@@ -248,7 +248,9 @@ returns true if the current image handlers can read this file
 
 \func{wxImage}{Blur}{\param{int}{ blurRadius}}
 
-Blurs the image in both horizontal and vertical directions by the specified pixel {\it blurRadius}.
+Blurs the image in both horizontal and vertical directions by the specified pixel
+{\it blurRadius}. This should not be used when using a single mask colour
+for transparency.
 
 \wxheading{See also}
 
@@ -260,8 +262,8 @@ Blurs the image in both horizontal and vertical directions by the specified pixe
 
 \func{wxImage}{BlurHorizontal}{\param{int}{ blurRadius}}
 
-Blurs the image in the horizontal direction only.
-
+Blurs the image in the horizontal direction only. This should not be used
+when using a single mask colour for transparency.
 \wxheading{See also}
 
 \helpref{Blur}{wximageblur}
@@ -272,7 +274,8 @@ Blurs the image in the horizontal direction only.
 
 \func{wxImage}{BlurVertical}{\param{int}{ blurRadius}}
 
-Blurs the image in the vertical direction only.
+Blurs the image in the vertical direction only. This should not be used
+when using a single mask colour for transparency.
 
 \wxheading{See also}
 
