X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/e5a2291ac72235414468467c451607de5ca10ffd..751731864888f00e31e6dce1092ac28a1fac5358:/docs/latex/wx/sckaddr.tex?ds=sidebyside

diff --git a/docs/latex/wx/sckaddr.tex b/docs/latex/wx/sckaddr.tex
index f756b1c803..07c38fbe29 100644
--- a/docs/latex/wx/sckaddr.tex
+++ b/docs/latex/wx/sckaddr.tex
@@ -16,6 +16,7 @@ You are unlikely to need to use this class: only wxSocketBase uses it.
 \wxheading{See also}
 
 \helpref{wxSocketBase}{wxsocketbase}
+\helpref{wxIPaddress}{wxipaddress}
 \helpref{wxIPV4address}{wxipv4address}
 
 % ----------------------------------------------------------------------------
@@ -55,3 +56,4 @@ Delete all informations about the address.
 \func{int}{SockAddrLen}{\void}
 
 Returns the length of the socket address.
+
