X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/e5a2291ac72235414468467c451607de5ca10ffd..267a7108512069169a855457d027cd68fed5bf2e:/docs/latex/wx/ipvaddr.tex?ds=sidebyside

diff --git a/docs/latex/wx/ipvaddr.tex b/docs/latex/wx/ipvaddr.tex
index 54087b26bd..1e2fddfdb5 100644
--- a/docs/latex/wx/ipvaddr.tex
+++ b/docs/latex/wx/ipvaddr.tex
@@ -100,7 +100,6 @@ to {\bf INADDR\_ANY}.
 
 Returns TRUE on success, FALSE if something went wrong.
 
-
 %
 % LocalHost
 %
@@ -109,7 +108,7 @@ Returns TRUE on success, FALSE if something went wrong.
 
 \func{bool}{LocalHost}{\void}
 
-Set address to localhost (127.0.0.1). Whenever possible, use the
+Set address to localhost (127.0.0.1). Whenever possible, use the 
 \helpref{wxIPV4address::AnyAddress}{wxipv4addressanyaddress},
 function instead of this one, as this will correctly handle multi-homed
 hosts and avoid other small problems.
@@ -117,3 +116,4 @@ hosts and avoid other small problems.
 \wxheading{Return value}
 
 Returns TRUE on success, FALSE if something went wrong.
+
