X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/e554d626b7d4164b1cca6a206e11ce376475f01c..9bf6a1b80cb856903e15387ebecc926142e73010:/docs/latex/wx/evthand.tex

diff --git a/docs/latex/wx/evthand.tex b/docs/latex/wx/evthand.tex
index e7ad8ef8f2..a52f29a4eb 100644
--- a/docs/latex/wx/evthand.tex
+++ b/docs/latex/wx/evthand.tex
@@ -18,6 +18,10 @@ will be identical to the "this" pointer for the wxEvtHandler portion.
 
 <wx/event.h>
 
+\wxheading{Library}
+
+\helpref{wxBase}{librarieslist}
+
 \wxheading{See also}
 
 \overview{Event handling overview}{eventhandlingoverview}
@@ -40,7 +44,7 @@ each other.
 
 \membersection{wxEvtHandler::AddPendingEvent}\label{wxevthandleraddpendingevent}
 
-\func{void}{AddPendingEvent}{\param{wxEvent\& }{event}}
+\func{virtual void}{AddPendingEvent}{\param{const wxEvent\& }{event}}
 
 This function posts an event to be processed later.
 
@@ -121,6 +125,9 @@ handler is disconnected.}
 
 \membersection{wxEvtHandler::Disconnect}\label{wxevthandlerdisconnect}
 
+\func{bool}{Disconnect}{\param{wxEventType }{eventType = wxEVT\_NULL}, \param{wxObjectEventFunction}{ function = NULL},
+ \param{wxObject*}{ userData = NULL}, \param{wxEvtHandler*}{ eventSink = NULL}}
+
 \func{bool}{Disconnect}{\param{int}{ id = \texttt{wxID\_ANY}},
  \param{wxEventType }{eventType = wxEVT\_NULL}, \param{wxObjectEventFunction}{ function = NULL},
  \param{wxObject*}{ userData = NULL}, \param{wxEvtHandler*}{ eventSink = NULL}}
