X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/e53a95bcb122a06a74e116aba717b0d7a5bdc1b8..763b330106e9d3c9c198fc1b1cac4e1ca06c222f:/docs/latex/wx/artprov.tex?ds=sidebyside

diff --git a/docs/latex/wx/artprov.tex b/docs/latex/wx/artprov.tex
index fedf79d678..16a804837e 100644
--- a/docs/latex/wx/artprov.tex
+++ b/docs/latex/wx/artprov.tex
@@ -176,12 +176,12 @@ The bitmap if one of registered providers recognizes the ID or wxNullBitmap othe
 Same as \helpref{wxArtProvider::GetBitmap}{wxartprovidergetbitmap}, but
 return a wxIcon object (or wxNullIcon on failure).
 
-\func{static wxSize}{GetSizeHint}{\param{const wxArtClient\& }{client}, \param{bool }{platform_default = false}}
+\func{static wxSize}{GetSizeHint}{\param{const wxArtClient\& }{client}, \param{bool }{platform\_default = false}}
 
 Returns a suitable size hint for the given {\it wxArtClient}. If 
-{\it platform_default} is \true, return a size based on the current platform, 
+{\it platform\_default} is \true, return a size based on the current platform, 
 otherwise return the size from the topmost wxArtProvider. {\it wxDefaultSize} may be 
-returned if the client doesn't have a specified size, like wxART_OTHER for example.
+returned if the client doesn't have a specified size, like wxART\_OTHER for example.
 
 \membersection{wxArtProvider::PopProvider}\label{wxartproviderctor}
 
