X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/e4861c72be058dd9d7e12cb77127d0be523414c8..852b6c3ce7baa055da25f5254f6ee2eee0cd79b7:/docs/latex/wx/notebook.tex

diff --git a/docs/latex/wx/notebook.tex b/docs/latex/wx/notebook.tex
index ea9dedcc48..82e7e3f24e 100644
--- a/docs/latex/wx/notebook.tex
+++ b/docs/latex/wx/notebook.tex
@@ -199,7 +199,7 @@ The call to this function generates the page changing events.
 
 \constfunc{wxWindow *}{GetCurrentPage}{\void}
 
-Returns the currently selected notebook age or \texttt{NULL}.
+Returns the currently selected notebook page or \NULL.
 
 
 \membersection{wxNotebook::GetImageList}\label{wxnotebookgetimagelist}
@@ -273,7 +273,7 @@ to {\tt SetBackgroundColour}. Otherwise, an uninitialised colour will be returne
 \func{int}{HitTest}{\param{const wxPoint\&}{ pt}, \param{long}{ *flags = {\tt NULL}}}
 
 Returns the index of the tab at the specified position or {\tt wxNOT\_FOUND}
-if none. If {\it flags} parameter is non {\tt NULL}, the position of the point
+if none. If {\it flags} parameter is non-{\tt NULL}, the position of the point
 inside the tab is returned as well.
 
 \wxheading{Parameters}
