X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/e4592d6028994185932718f2886b8b97a004f5b8..5a20d2ced0a0779b5d8b1cc8064f8404b2727e92:/docs/latex/wx/stopwtch.tex

diff --git a/docs/latex/wx/stopwtch.tex b/docs/latex/wx/stopwtch.tex
index 95c370082b..33349bb46e 100644
--- a/docs/latex/wx/stopwtch.tex
+++ b/docs/latex/wx/stopwtch.tex
@@ -21,7 +21,7 @@ use it to measure the time elapsed by some function:
 
 \wxheading{See also}
 
-\helpref{::wxStartTimer}{wxstarttimer}, \helpref{::wxGetElapsedTime}{wxgetelapsedtime}, \helpref{wxTimer}{wxtimer}
+\helpref{wxTimer}{wxtimer}
 
 \latexignore{\rtfignore{\wxheading{Members}}}
 
