X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/e4592d6028994185932718f2886b8b97a004f5b8..2712e31795ee7ab4de62189b440d702f3f849c0d:/docs/latex/wx/stopwtch.tex

diff --git a/docs/latex/wx/stopwtch.tex b/docs/latex/wx/stopwtch.tex
index 95c370082b..1f756a493f 100644
--- a/docs/latex/wx/stopwtch.tex
+++ b/docs/latex/wx/stopwtch.tex
@@ -19,9 +19,13 @@ use it to measure the time elapsed by some function:
 
 <wx/stopwatch.h>
 
+\wxheading{Library}
+
+\helpref{wxBase}{librarieslist}
+
 \wxheading{See also}
 
-\helpref{::wxStartTimer}{wxstarttimer}, \helpref{::wxGetElapsedTime}{wxgetelapsedtime}, \helpref{wxTimer}{wxtimer}
+\helpref{wxTimer}{wxtimer}
 
 \latexignore{\rtfignore{\wxheading{Members}}}
 
