X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/e3a630bb68247e39c04864cdcdb2178ded515f03..7021360ad735eca88fac897b9fd43443184773fd:/docs/latex/wx/progdlg.tex

diff --git a/docs/latex/wx/progdlg.tex b/docs/latex/wx/progdlg.tex
index 5758f848d5..a34a5b9acd 100644
--- a/docs/latex/wx/progdlg.tex
+++ b/docs/latex/wx/progdlg.tex
@@ -75,7 +75,7 @@ ABORT.
 
 \membersection{wxProgressDialog::Update}\label{wxprogressdialogupdate}
 
-\func{bool}{Update}{
+\func{virtual bool}{Update}{
   \param{int }{value},\rtfsp
   \param{const wxString\& }{newmsg = ""}}
 
@@ -89,9 +89,9 @@ dialog may be resumed with \helpref{Resume}{wxprogressdialogresume} function.
 
 \wxheading{Parameters}
 
-\docparam{value}{The new value of the progress meter. It must be strictly less
-than the maximum value given to the constructor (i.e., as usual in C, the
-index runs from $0$ to $maximum-1$).}
+\docparam{value}{The new value of the progress meter. It should be less than or
+equal to the maximum value given to the constructor and the dialog is closed if
+it is equal to the maximum.}
 \docparam{newmsg}{The new messages for the progress dialog text, if it is
 empty (which is the default) the message is not changed.}
 
