X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/e384095a6c8445e95e8a2478bb0bde9f7cfd0f76..adfa6f1a48e0b22e06a7626198a28c240cc94cf3:/docs/latex/wx/splitter.tex?ds=inline

diff --git a/docs/latex/wx/splitter.tex b/docs/latex/wx/splitter.tex
index 70e6a954c2..3c09fc7a71 100644
--- a/docs/latex/wx/splitter.tex
+++ b/docs/latex/wx/splitter.tex
@@ -114,7 +114,7 @@ Destroys the wxSplitterWindow and its children.
 
 \membersection{wxSplitterWindow::Create}\label{wxsplitterwindowcreate}
 
-\func{bool}{Create}{\param{wxWindow*}{ parent}, \param{wxWindowID}{ id}, \param{int }{x},\rtfsp
+\func{bool}{Create}{\param{wxWindow*}{ parent}, \param{wxWindowID}{ id}, \rtfsp
 \param{const wxPoint\& }{point = wxDefaultPosition}, \param{const wxSize\& }{size = wxDefaultSize},\rtfsp
 \param{long }{style=wxSP\_3D}, \param{const wxString\&}{ name = "splitterWindow"}}
 
@@ -331,6 +331,15 @@ Does not currently check for an out-of-range value.
 
 \helpref{wxSplitterWindow::GetSashPosition}{wxsplitterwindowgetsashposition}
 
+\membersection{wxSplitterWindow::SetSashSize}\label{wxsplitterwindowsetsashsize}
+
+\func{void}{SetSashSize}{\param{int }{size}}
+
+Sets the sash size. Normally, the sash size is determined according to the metrics
+of each platform, but the application can override this, for example to show
+a thin sash that the user is not expected to drag. If {\it size} is more -1,
+the custom sash size will be used.
+
 \membersection{wxSplitterWindow::SetMinimumPaneSize}\label{wxsplitterwindowsetminimumpanesize}
 
 \func{void}{SetMinimumPaneSize}{\param{int }{paneSize}}
