X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/e2a6f23364aefcd5095dc6558e3ab8144363fa96..dba7934c9d1b520ff7b48cd0d80cc52f8be6a052:/docs/latex/wx/ddeservr.tex

diff --git a/docs/latex/wx/ddeservr.tex b/docs/latex/wx/ddeservr.tex
index 36c2436114..77638928aa 100644
--- a/docs/latex/wx/ddeservr.tex
+++ b/docs/latex/wx/ddeservr.tex
@@ -11,25 +11,29 @@ of this API is available using \helpref{wxTCPServer}{wxtcpserver}.
 
 wxServerBase
 
+\wxheading{Include files}
+
+<wx/dde.h>
+
 \wxheading{See also}
 
 \helpref{wxDDEClient}{wxddeclient}, \helpref{wxDDEConnection}{wxddeconnection}, \helpref{IPC overview}{ipcoverview}
 
 \latexignore{\rtfignore{\wxheading{Members}}}
 
-\membersection{wxDDEServer::wxDDEServer}
+\membersection{wxDDEServer::wxDDEServer}\label{wxddeserverctor}
 
 \func{}{wxDDEServer}{\void}
 
 Constructs a server object.
 
-\membersection{wxDDEServer::Create}
+\membersection{wxDDEServer::Create}\label{wxddeservercreate}
 
 \func{bool}{Create}{\param{const wxString\& }{service}}
 
 Registers the server using the given service name. Under UNIX, the
 string must contain an integer id which is used as an Internet port
-number. FALSE is returned if the call failed (for example, the port
+number. false is returned if the call failed (for example, the port
 number is already in use).
 
 \membersection{wxDDEServer::OnAcceptConnection}\label{wxddeserveronacceptconnection}
@@ -45,4 +49,3 @@ Under UNIX, when a server is created the OnAcceptConnection message is
 always sent for standard input and output, but in the context of DDE
 messages it doesn't make a lot of sense.
 
-
