X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/e2a6f23364aefcd5095dc6558e3ab8144363fa96..15f43e762c01635eec4d6a840e9a6f7c941e39cb:/docs/latex/wx/ddeconn.tex

diff --git a/docs/latex/wx/ddeconn.tex b/docs/latex/wx/ddeconn.tex
index 5a197e708d..1436df1220 100644
--- a/docs/latex/wx/ddeconn.tex
+++ b/docs/latex/wx/ddeconn.tex
@@ -21,6 +21,10 @@ of this API is available using \helpref{wxTCPConnection}{wxtcpconnection}.
 wxConnectionBase\\
 \helpref{wxObject}{wxobject}
 
+\wxheading{Include files}
+
+<wx/dde.h>
+
 \wxheading{Types}
 
 \index{wxIPCFormat}wxIPCFormat is defined as follows:
@@ -195,4 +199,3 @@ Called by the client application to ask if an advise loop can be
 stopped. Causes the server connection's \helpref{wxDDEConnection::OnStopAdvise}{wxddeconnectiononstopadvise} member
 to be called. Returns TRUE if the server okays it, FALSE otherwise.
 
-
