X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/e2622169f41272d053f62f61243b8571fc6629ce..001828ed69cd0fd34231bf1c52a6ede3933bf25d:/docs/latex/wx/auimanager.tex

diff --git a/docs/latex/wx/auimanager.tex b/docs/latex/wx/auimanager.tex
index 7f36a92960..b522c9c2d9 100644
--- a/docs/latex/wx/auimanager.tex
+++ b/docs/latex/wx/auimanager.tex
@@ -72,7 +72,8 @@ understand layers is by running the wxAUI sample.
 
 \wxheading{Derived from}
 
-\helpref{wxEvtHandler}{wxevthandler}
+\helpref{wxEvtHandler}{wxevthandler}\\
+\helpref{wxObject}{wxobject}
 
 \wxheading{Include files}
 
@@ -125,7 +126,7 @@ enum wxAuiManagerOption
 
 \func{}{wxAuiManager}{\param{wxWindow* }{managed\_wnd = NULL}, \param{unsigned int }{flags = wxAUI\_MGR\_DEFAULT}}
 
-Constructor. \arg{frame} specifies the wxFrame which should be managed.
+Constructor. \arg{managed\_wnd} specifies the wxFrame which should be managed.
 \arg{flags}  specifies options which allow the frame management behavior
 to be modified.
 
@@ -166,9 +167,11 @@ Returns the current art provider being used.
 
 See also: \helpref{wxAuiDockArt}{wxauidockart}.
 
+\membersection{wxAuiManager::GetDockSizeConstraint}\label{wxauimanagergetdocksizeconstraint}
+
 \func{void}{GetDockSizeConstraint}{\param{double* }{widthpct}, \param{double* }{heightpct}}
 
-Returns the current dock constraint values.  See SetDockSizeConstraint() for more information.
+Returns the current dock constraint values.  See \helpref{SetDockSizeConstraint()}{wxauimanagersetdocksizeconstraint} for more information.
 
 \membersection{wxAuiManager::GetFlags}\label{wxauimanagergetflags}
 
@@ -182,6 +185,8 @@ Returns the current manager's flags.
 
 Returns the frame currently being managed by wxAuiManager.
 
+\membersection{wxAuiManager::GetManager}\label{wxauimanagergetmanager}
+
 \func{static wxAuiManager*}{GetManager}{\param{wxWindow* }{window}}
 
 Calling this method will return the wxAuiManager for a given window.  The \arg{window} parameter should
@@ -269,6 +274,8 @@ will be deleted by wxAuiManager.
 
 See also: \helpref{wxAuiDockArt}{wxauidockart}.
 
+\membersection{wxAuiManager::SetDockSizeConstraint}\label{wxauimanagersetdocksizeconstraint}
+
 \func{void}{SetDockSizeConstraint}{\param{double }{widthpct}, \param{double }{heightpct}}
 
 When a user creates a new dock by dragging a window into a docked position, often times the large size of the
