X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/e2478fde622a16d25c66690af353dfdc37e7b582..0376ed540882131da043250a4341389f18f34bf6:/docs/latex/wx/cppconst.tex

diff --git a/docs/latex/wx/cppconst.tex b/docs/latex/wx/cppconst.tex
index 519b965b8e..4af9a323a3 100644
--- a/docs/latex/wx/cppconst.tex
+++ b/docs/latex/wx/cppconst.tex
@@ -10,6 +10,7 @@ by category (and sorted by alphabetical order inside each category).
 \twocolitem{\_\_WIN16\_\_}{Win16 API (not supported since wxWindows 2.6)}
 \twocolitem{\_\_WIN32\_\_}{Win32 API}
 \twocolitem{\_\_WIN95\_\_}{Windows 95 or NT 4.0 and above system (not NT 3.5x)}
+\twocolitem{\_\_WXBASE\_\_}{Only wxBase, no GUI features}
 \twocolitem{\_\_WXGTK\_\_}{GTK}
 \twocolitem{\_\_WXGTK12\_\_}{GTK 1.2 or higher}
 \twocolitem{\_\_WXGTK20\_\_}{GTK 2.0 or higher}
@@ -102,12 +103,15 @@ the compiler version, $1100$ is $11.0$ and $1200$ is OpenWatcom.}
 \begin{twocollist}\itemsep=0pt
 \twocolitem{\_\_WXWINDOWS\_\_}{always defined in wxWindows applications, see
 also \helpref{wxCHECK\_VERSION}{wxcheckversion}}
-\twocolitem{\_\_WXBASE\_\_}{only used by wxWindows internally (defined when
-building wxBase code, either as a standalone library or as part of the
-monolithis wxWindows library, not defined when building GUI library only)}
 \twocolitem{\_\_WXDEBUG\_\_}{defined in debug mode, undefined in release mode}
 \twocolitem{wxUSE\_XXX}{if defined as $1$, feature XXX is active
 (the symbols of this form are always defined, use \#if and not \#ifdef to test
  for them)}
+\twocolitem{wxUSE\_GUI}{this particular feature test macro is defined to $1$
+when compiling or using the library with the GUI features activated, if it is
+defined as $0$, only wxBase is available.}
+\twocolitem{wxUSE\_BASE}{only used by wxWindows internally (defined as $1$ when
+building wxBase code, either as a standalone library or as part of the
+monolithic wxWindows library, defined as $0$ when building GUI library only)}
 \end{twocollist}
 
