X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/e215ce5cec83f77a7dc19dd84755b976d91d0ff0..305c49a1a93b6c0b6092f0fe1eb855fdd31c2618:/docs/latex/wx/arrstrng.tex?ds=sidebyside

diff --git a/docs/latex/wx/arrstrng.tex b/docs/latex/wx/arrstrng.tex
index 7fbf58269c..a91d710d9d 100644
--- a/docs/latex/wx/arrstrng.tex
+++ b/docs/latex/wx/arrstrng.tex
@@ -144,14 +144,6 @@ Clears the array contents and frees memory.
 
 See also: \helpref{Empty}{wxarraystringempty}
 
-\membersection{wxArrayString::Count}\label{wxarraystringcount}
-
-\constfunc{size\_t}{Count}{\void}
-
-Returns the number of items in the array. This function is deprecated and is
-for backwards compatibility only, please use 
-\helpref{GetCount}{wxarraystringgetcount} instead.
-
 \membersection{wxArrayString::Empty}\label{wxarraystringempty}
 
 \func{void}{Empty}{\void}
