X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/e21011866e9a89b5abda727f80e666ed2d7041c7..416101beab0f6ac3396ae41df9be6418eebd12c2:/docs/latex/wx/wxstring.tex

diff --git a/docs/latex/wx/wxstring.tex b/docs/latex/wx/wxstring.tex
index 9f242d2240..6ff8f7b050 100644
--- a/docs/latex/wx/wxstring.tex
+++ b/docs/latex/wx/wxstring.tex
@@ -621,6 +621,16 @@ This static function returns the string containing the result of calling
 
 Returns the number of occurrences of {\it ch} in the string.
 
+\membersection{wxString::FromAscii}\label{wxstringfromascii}
+
+\func{static wxString }{FromAscii}{\param{const char*}{ s}}
+
+\func{static wxString }{FromAscii}{\param{const char}{ c}}
+
+Converts the string or character from an ASCII, 7-bit form
+to the native wxString representation. Most useful when using
+a Unicode build of wxWindows.
+
 \membersection{wxString::GetChar}\label{wxstringgetchar}
 
 \constfunc{char}{GetChar}{\param{size\_t}{ n}}
@@ -908,6 +918,17 @@ have different meaning).
 Returns the part of the string between the indices {\it from} and {\it to}
 inclusive.
 
+\membersection{wxString::ToAscii}\label{wxstringtoascii}
+
+\constfunc{const char*}{ToAscii}{\void}
+
+Converts the string to an ASCII, 7-bit string (ANSI builds only).
+
+\constfunc{const wxCharBuffer}{ToAscii}{\void}
+
+Converts the string to an ASCII, 7-bit string in the form of
+a wxCharBuffer (Unicode builds only).
+
 \membersection{wxString::ToDouble}\label{wxstringtodouble}
 
 \constfunc{bool}{ToDouble}{\param{double}{ *val}}
