X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/e1f36ff823aa21414b756cbe451853d1f1338fd9..80d2803f703d1b238f42725504f08266ef02defe:/docs/latex/wx/button.tex

diff --git a/docs/latex/wx/button.tex b/docs/latex/wx/button.tex
index 7bac1a1118..966fa06461 100644
--- a/docs/latex/wx/button.tex
+++ b/docs/latex/wx/button.tex
@@ -18,7 +18,13 @@ almost any other window.
 
 \wxheading{Window styles}
 
-There are no special styles for wxButton.
+\twocolwidtha{5cm}%
+\begin{twocollist}\itemsep=0pt
+\twocolitem{\windowstyle{wxBU\_LEFT}}{Left-justifies the label. WIN32 only.}
+\twocolitem{\windowstyle{wxBU\_TOP}}{Aligns the label to the top of the button. WIN32 only.}
+\twocolitem{\windowstyle{wxBU\_RIGHT}}{Right-justifies the bitmap label. WIN32 only.}
+\twocolitem{\windowstyle{wxBU\_BOTTOM}}{Aligns the label to the bottom of the button. WIN32 only.}
+\end{twocollist}
 
 See also \helpref{window styles overview}{windowstyles}.
 
@@ -120,7 +126,7 @@ Under Windows, only dialog box buttons respond to this function.  As
 normal under Windows and Motif, pressing return causes the default button to
 be depressed when the return key is pressed. See also \helpref{wxWindow::SetFocus}{wxwindowsetfocus}\rtfsp
 which sets the keyboard focus for windows and text panel items,\rtfsp
-and \helpref{wxWindow::GetDefaultItem}{wxwindowgetdefaultitem}.
+and \helpref{wxPanel::SetDefaultItem}{wxpanelsetdefaultitem}.
 
 Note that under Motif, calling this function immediately after
 creation of a button and before the creation of other buttons
