X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/e12be2f7fb5f55553795b7c4168007173511d581..a6d57d0388f29fca011b0e168e926b61be0f465c:/docs/latex/wx/toolbar.tex?ds=inline

diff --git a/docs/latex/wx/toolbar.tex b/docs/latex/wx/toolbar.tex
index 84f98efaf1..d5c0824faa 100644
--- a/docs/latex/wx/toolbar.tex
+++ b/docs/latex/wx/toolbar.tex
@@ -168,12 +168,16 @@ Adds a separator for spacing groups of tools.
 
 \membersection{wxToolBar::AddTool}\label{wxtoolbaraddtool}
 
+\func{wxToolBarTool*}{AddTool}{\param{int}{ toolId}, \param{const wxBitmap\&}{ bitmap1},\rtfsp
+\param{const wxString\& }{shortHelpString = ""}, \param{const wxString\& }{longHelpString = ""}}
+
 \func{wxToolBarTool*}{AddTool}{\param{int}{ toolId}, \param{const wxBitmap\&}{ bitmap1},\rtfsp
 \param{const wxBitmap\&}{ bitmap2 = wxNullBitmap}, \param{bool}{ isToggle = FALSE},\rtfsp
 \param{long}{ xPos = -1}, \param{long}{ yPos = -1},\rtfsp
 \param{wxObject* }{clientData = NULL}, \param{const wxString\& }{shortHelpString = ""}, \param{const wxString\& }{longHelpString = ""}}
 
-Adds a tool to the toolbar.
+Adds a tool to the toolbar. The first (short and most commonly used) version
+adds a normal (and not a togglable) button without any associated client data.
 
 \wxheading{Parameters}
 
@@ -251,6 +255,9 @@ Enables or disables the tool.
 
 \docparam{enable}{If TRUE, enables the tool, otherwise disables it.}
 
+{\bf NB:} This function should only be called after 
+\helpref{Realize}{wxtoolbarrealize}.
+
 \wxheading{Remarks}
 
 For wxToolBarSimple, does nothing. Some other implementations
@@ -392,8 +399,6 @@ Returns the default separator size.
 
 Returns the short help for the given tool.
 
-Returns the long help for the given tool.
-
 \wxheading{Parameters}
 
 \docparam{toolId}{The tool in question.}
