X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/e12be2f7fb5f55553795b7c4168007173511d581..3e02f5ed14d30d059c2f94a871f25a5a7ff8eee9:/docs/latex/wx/toolbar.tex

diff --git a/docs/latex/wx/toolbar.tex b/docs/latex/wx/toolbar.tex
index 84f98efaf1..20d988a8f8 100644
--- a/docs/latex/wx/toolbar.tex
+++ b/docs/latex/wx/toolbar.tex
@@ -251,6 +251,9 @@ Enables or disables the tool.
 
 \docparam{enable}{If TRUE, enables the tool, otherwise disables it.}
 
+{\bf NB:} This function should only be called after 
+\helpref{Realize}{wxtoolbarrealize}.
+
 \wxheading{Remarks}
 
 For wxToolBarSimple, does nothing. Some other implementations
