X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/e0f6b731a80035dab1c2d1224f8a2dea0c9de947..4383e2b12aa48171114576725d5cead06e7e962a:/docs/latex/wx/process.tex

diff --git a/docs/latex/wx/process.tex b/docs/latex/wx/process.tex
index d19b33a4b0..4f94f2b2a6 100644
--- a/docs/latex/wx/process.tex
+++ b/docs/latex/wx/process.tex
@@ -188,7 +188,7 @@ under both Unix and Windows but all the other signals are equivalent to
 The {\it flags} parameter can be wxKILL\_NOCHILDREN (the default),
 or wxKILL\_CHILDREN, in which case the child processes of this
 process will be killed too. Note that under Unix, for wxKILL\_CHILDREN
-to work you should have created the process passing wxEXEC\_MAKE_GROUP\_LEADER.
+to work you should have created the process passing wxEXEC\_MAKE\_GROUP\_LEADER.
 
 Returns the element of {\tt wxKillError} enum:
 
