X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/e0c8d2d9247f23a84ed0a588b7340e0168b88403..bc55e31bdc7fbf6f1006f298ed8310e7972984e9:/docs/latex/wx/function.tex?ds=sidebyside

diff --git a/docs/latex/wx/function.tex b/docs/latex/wx/function.tex
index 46c88f3a11..7addfe5654 100644
--- a/docs/latex/wx/function.tex
+++ b/docs/latex/wx/function.tex
@@ -2955,7 +2955,8 @@ and current pointer position in screen coordinates.
 
 \func{wxWindow *}{wxGetActiveWindow}{\void}
 
-Gets the currently active window (Windows only).
+Gets the currently active window (implemented for MSW and GTK only currently,
+always returns \NULL in the other ports).
 
 \wxheading{Include files}
 
@@ -4322,7 +4323,7 @@ compilation error messages if the condition they check fail.
 
 \membersection{::wxOnAssert}\label{wxonassert}
 
-\func{void}{wxOnAssert}{\param{const char *}{fileName}, \param{int}{ lineNumber}, \param{const char *}{cond}, \param{const char *}{msg = NULL}}
+\func{void}{wxOnAssert}{\param{const char *}{fileName}, \param{int}{ lineNumber}, \param{const char *}{func}, \param{const char *}{cond}, \param{const char *}{msg = NULL}}
 
 This function is called whenever one of debugging macros fails (i.e. condition
 is false in an assertion). It is only defined in the debug mode, in release
