X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/e0c8d2d9247f23a84ed0a588b7340e0168b88403..3c1f8cb1f5cbef0f7699110fd28027948e644c6f:/docs/latex/wx/stackwalker.tex?ds=inline

diff --git a/docs/latex/wx/stackwalker.tex b/docs/latex/wx/stackwalker.tex
index f1ec17f0ba..e99b65774b 100644
--- a/docs/latex/wx/stackwalker.tex
+++ b/docs/latex/wx/stackwalker.tex
@@ -97,3 +97,4 @@ notice that Walk() frame itself is not included if skip $\ge 1$).
 Enumerate stack frames from the location of uncaught exception.
 This method can only be called from
 \helpref{wxApp::OnFatalException()}{wxapponfatalexception}.
+
