X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/e0c8d2d9247f23a84ed0a588b7340e0168b88403..13b555259270512e01b20631c60468327fd08ba7:/docs/latex/wx/stackwalker.tex

diff --git a/docs/latex/wx/stackwalker.tex b/docs/latex/wx/stackwalker.tex
index f1ec17f0ba..562e80eb76 100644
--- a/docs/latex/wx/stackwalker.tex
+++ b/docs/latex/wx/stackwalker.tex
@@ -82,13 +82,15 @@ This function must be overrided to process the given frame.
 
 \membersection{wxStackWalker::Walk}\label{wxstackwalkerwalk}
 
-\func{void}{Walk}{\param{size\_t }{skip = 1}}
+\func{void}{Walk}{\param{size\_t }{skip = 1}, \param{size\_t }{maxDepth = 200}}
 
 Enumerate stack frames from the current location, skipping the initial
 number of them (this can be useful when Walk() is called from some known
 location and you don't want to see the first few frames anyhow; also
 notice that Walk() frame itself is not included if skip $\ge 1$).
 
+Up to \arg{maxDepth} frames are walked from the innermost to the outermost one.
+
 
 \membersection{wxStackWalker::WalkFromException}\label{wxstackwalkerwalkfromexception}
 
@@ -97,3 +99,4 @@ notice that Walk() frame itself is not included if skip $\ge 1$).
 Enumerate stack frames from the location of uncaught exception.
 This method can only be called from
 \helpref{wxApp::OnFatalException()}{wxapponfatalexception}.
+
