X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/e0c8d2d9247f23a84ed0a588b7340e0168b88403..1219d8a408594758df81e0d459dc80edb3bd26e0:/docs/latex/wx/function.tex

diff --git a/docs/latex/wx/function.tex b/docs/latex/wx/function.tex
index 46c88f3a11..78ae7251df 100644
--- a/docs/latex/wx/function.tex
+++ b/docs/latex/wx/function.tex
@@ -1215,10 +1215,14 @@ Removes \arg{file}, returning true if successful.
 
 \membersection{::wxRenameFile}\label{wxrenamefile}
 
-\func{bool}{wxRenameFile}{\param{const wxString\& }{file1}, \param{const wxString\& }{file2}}
+\func{bool}{wxRenameFile}{\param{const wxString\& }{file1}, \param{const wxString\& }{file2}, \param{bool }{overwrite = true}}
 
 Renames \arg{file1} to \arg{file2}, returning true if successful.
 
+If \arg{overwrite} parameter is true (default), the destination file is
+overwritten if it exists, but if \arg{overwrite} is false, the functions fails
+in this case.
+
 
 \membersection{::wxRmdir}\label{wxrmdir}
 
@@ -2955,7 +2959,8 @@ and current pointer position in screen coordinates.
 
 \func{wxWindow *}{wxGetActiveWindow}{\void}
 
-Gets the currently active window (Windows only).
+Gets the currently active window (implemented for MSW and GTK only currently,
+always returns \NULL in the other ports).
 
 \wxheading{Include files}
 
@@ -4322,7 +4327,7 @@ compilation error messages if the condition they check fail.
 
 \membersection{::wxOnAssert}\label{wxonassert}
 
-\func{void}{wxOnAssert}{\param{const char *}{fileName}, \param{int}{ lineNumber}, \param{const char *}{cond}, \param{const char *}{msg = NULL}}
+\func{void}{wxOnAssert}{\param{const char *}{fileName}, \param{int}{ lineNumber}, \param{const char *}{func}, \param{const char *}{cond}, \param{const char *}{msg = NULL}}
 
 This function is called whenever one of debugging macros fails (i.e. condition
 is false in an assertion). It is only defined in the debug mode, in release
